Center at RA 18 26 32.10000 DEC 27 08 08.0000

CONT: 1824+271 IPOL 4988.365 MHZ 1824+271.IIM001.2

PLot file version 1 created 27-MAY-2005 17:44:40

Cont peak flux = 7.6601E-02 JY/BEAM Levs = 7.660E-02 * (-0.158, 0.158, 0.316, 0.632)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100