Gain amp vs UTC time for 2323+790.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 1 created 27-MAY-2005 17:51:08

1 JB IF 1R

1.10 1.05 1.00 0.95 1 JB IF 1L

1.00 0.95 0.90 0.85

1 JB IF 2R 1.4 1.3 1.2 1 JB IF 2L 1.0 0.9 0.8 2 WB IF 1R 1.3 1.2 1.1 1.0 2 WB IF 1L

Gain

1.3 1.2 1.1 1.0 2 WB IF 2R 1.2 1.1 1.0 0.9 2 WB IF 2L 1.3 1.2 1.1 1.0 0.9 3 EF IF 1R

1.00 0.95 0.90

3 EF IF 1L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04

1.05

1.00

0.95

Gain amp vs UTC time for 2323+790.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 2 created 27-MAY-2005 17:51:08

3 EF IF 2R

1.05 1.00 0.95 0.90 3 EF IF 2L

1.02 1.00 0.98 0.96 0.94 0.92

4 ON IF 1R 2.0 1.5 1.0 0.5 4 ON IF 1L 2.5 2.0 1.5 1.0 4 ON IF 2R 1.8 1.6 1.4 1.2 1.0 0.8 4 ON IF 2L

Gain

2.0 1.5 1.0 5 MC IF 1R 1.2 1.1 1.0 0.9 5 MC IF 1L 1.2 1.1 1.0 0.9 5 MC IF 2R 1.2 1.1 1.0 0.9 5 MC IF 2L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04

1.2 1.1 1.0 0.9

Gain amp vs UTC time for 2323+790.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 3 created 27-MAY-2005 17:51:08

6 NT IF 1R 3 2 1 6 NT IF 1L 3 2 1 6 NT IF 2R 2.0 1.5 1.0 0.5 6 NT IF 2L 3 2 1 7 TR IF 1R 0.9 0.8 0.7 7 TR IF 1L

Gain

1.1 1.0 0.9 7 TR IF 2R 1.0 0.9 0.8 7 TR IF 2L 1.1 1.0 0.9 8 SH IF 2R

4.865 4.860 4.855 4.850 8 SH IF 2L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04

3.260 3.255 3.250 3.245

Gain amp vs UTC time for 2323+790.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 4 created 27-MAY-2005 17:51:08

9 UR IF 1R

3.615 3.610 3.605 3.600 9 UR IF 1L

5.785 5.780 5.775 5.770

9 UR IF 2R

10.995 10.990 10.985 10.980 9 UR IF 2L

Gain

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00 1/02 1/04

5.535 5.530 5.525 5.520