Center at RA 15 50 35.26924 DEC 05 27 10.4482

CONT: 1548+056 IPOL 8415.021 MHZ 1548+056.ICL001.5

PLot file version 1 created 04-FEB-2004 17:16:23

Cont peak flux = 1.4195E+00 JY/BEAM Levs = 1.419E+00 * (-0.020, 0.020, 0.040, 0.081, 0.161, 0.322, 0.644)

MilliARC SEC

MilliARC SEC

40 20 0 -20 -40

50

40

30

20

10

0

-10

-20

-30

-40

-50