Center at RA 18 00 45.68392 DEC 78 28 04.0185

CONT: 1803+784 IPOL 8415.021 MHZ 1803+784.ICL001.5

PLot file version 1 created 04-FEB-2004 17:16:41

Cont peak flux = 1.5460E+00 JY/BEAM Levs = 1.546E+00 * (-0.006, 0.006, 0.012, 0.023, 0.046, 0.093, 0.186, 0.371, 0.743)

MilliARC SEC

MilliARC SEC

40 20 0 -20 -40

50

40

30

20

10

0

-10

-20

-30

-40

-50