Center at RA 18 24 07.06837 DEC 56 51 01.4909

CONT: 1823+568 IPOL 8415.021 MHZ 1823+568.IIM001.2

PLot file version 1 created 04-FEB-2004 17:13:24

Cont peak flux = 1.3379E+00 JY/BEAM Levs = 1.338E+00 * (-0.221, 0.221, 0.441, 0.882)

MilliARC SEC

MilliARC SEC

40 20 0 -20 -40

50

40

30

20

10

0

-10

-20

-30

-40

-50