Center at RA 01 22 38.81600 DEC 25 02 31.7932

CONT: J0122+25 IPOL 4988.365 MHZ J0122+2502.ICL001.5

PLot file version 1 created 02-JUL-2004 12:50:04

Cont peak flux = 7.8321E-01 JY/BEAM Levs = 7.832E-01 * (-0.006, 0.006, 0.011, 0.023, 0.046, 0.091, 0.183, 0.366, 0.731)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100