Center at RA 22 53 57.74793 DEC 16 08 53.5609

CONT: 3C454.3 IPOL 6665.521 MHZ 3C454.3.IIM001.2

PLot file version 1 created 25-MAR-2004 19:18:55

Cont peak flux = 4.7610E+00 JY/BEAM Levs = 4.761E+00 * (-0.200, 0.200, 0.400, 0.800)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100