Gain amp vs UTC time for DA193.MULTI.1 SN 2 Lpol IF 1 - 4

Plot file version 1 created 25-JAN-2005 10:35:20

1L SC IF 1

1400

1200

1000

1L SC IF 2

1200 1100 1000 900 1L SC IF 3

1300 1200 1100 1000 900 1L SC IF 4

1300 1200 1100 1000 900 2L HN IF 1 960 940 920 900 2L HN IF 2

MilliGain

980 960 940 920 900 2L HN IF 3 960 940 920 900 880 2L HN IF 4

1020 1000 980 960 940 920 3L NL IF 1

1000 980 960 940 920 3L NL IF 2

TIME (HOURS)

05 06 07 08 09 10 11 12 13 14

1040 1020 1000 980 960 940

Gain amp vs UTC time for DA193.MULTI.1 SN 2 Lpol IF 1 - 4

Plot file version 2 created 25-JAN-2005 10:35:20

3L NL IF 3

1020 1000 980 960 940 3L NL IF 4

1040 1020 1000 980 960 940 4L FD IF 1

1060 1040 1020 1000 980 960 4L FD IF 2

1080 1060 1040 1020 1000 980 4L FD IF 3

1080 1060 1040 1020 1000 980 4L FD IF 4

MilliGain

1080 1060 1040 1020 1000 980 5L LA IF 1

1000 980 960 5L LA IF 2

1020

1000 980 5L LA IF 3

1020

1000 980 5L LA IF 4

TIME (HOURS)

05 06 07 08 09 10 11 12 13 14

1000 980 960 940

Gain amp vs UTC time for DA193.MULTI.1 SN 2 Lpol IF 1 - 4

Plot file version 3 created 25-JAN-2005 10:35:20

6L PT IF 1

1150

1100

1050

6L PT IF 2

1100

1050

1000 6L PT IF 3

1150

1100

1050

6L PT IF 4

1150

1100

1050

1000 8L OV IF 1

1040 1020 1000 980 960 8L OV IF 2

MilliGain

1040 1020 1000 980 960 8L OV IF 3

1060 1040 1020 1000 980 8L OV IF 4

1020 1000 980 960 940 9L BR IF 1

1000 980 960 9L BR IF 2

TIME (HOURS)

05 06 07 08 09 10 11 12 13 14

1000 980 960 940

Gain amp vs UTC time for DA193.MULTI.1 SN 2 Lpol IF 1 - 4

Plot file version 4 created 25-JAN-2005 10:35:20

9L BR IF 3

1080 1060 1040 1020 1000

9L BR IF 4

1020 1000 980 960 10L MK IF 1

1020 1000 980 960 10L MK IF 2

1060 1040 1020 1000 980 10L MK IF 3

1020 1000 980 960 10L MK IF 4

MilliGain

1060 1040 1020 1000 11L EF IF 1

1020 1010 1000 990 11L EF IF 2

1010 1000 990 11L EF IF 3

1020

1010

1000

11L EF IF 4

TIME (HOURS)

05 06 07 08 09 10 11 12 13 14

1020 1010 1000 990

Gain amp vs UTC time for DA193.MULTI.1 SN 2 Lpol IF 1 - 4

Plot file version 5 created 25-JAN-2005 10:35:20

13L WB IF 1 975 970 965 960 955 13L WB IF 2

1010

1000 990 13L WB IF 3 990 980 970 13L WB IF 4 970 960 950 14L ON IF 1

1100 1000 900 800 700 14L ON IF 2

MilliGain

1100 1000 900 800 700 14L ON IF 3

1000 800 600 14L ON IF 4

1100 1000 900 800 700 15L TR IF 1 800 750 700 15L TR IF 2

TIME (HOURS)

05 06 07 08 09 10 11 12 13 14

850 800 750

Gain amp vs UTC time for DA193.MULTI.1 SN 2 Lpol IF 1 - 4

Plot file version 6 created 25-JAN-2005 10:35:20

15L TR IF 3 900 850 800 15L TR IF 4

MilliGain

TIME (HOURS)

05 06 07 08 09 10 11 12 13 14

850 800 750 700