Center at RA 10 44 10.67302 DEC 53 22 20.5415

CONT: J1044+53 IPOL 4986.302 MHZ J1044+5322.ICL001.5

PLot file version 1 created 25-JAN-2005 10:35:53

Cont peak flux = 3.1618E-01 JY/BEAM Levs = 3.162E-01 * (-0.013, 0.013, 0.025, 0.050, 0.100, 0.200, 0.400, 0.801)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100