IF 2 CHAN 4 - 29 STK RR/LL

RatioPhas vs Time for GA032B.UVDATA.1 Vect aver. CL # 2 FG # 1

PLot file version1460 created 17-NOV-2014 17:14:35

200100 0 -100

EF-YS (1-4) CH 4

200100 0 -100

ON-YS (2-4) CH 4

200100 0 -100

YS-KY (4-5) CH 4

200100 0 -100

YS-KU (4-6) CH 4 200 100 0 -100

YS-KT (4-7) CH 4

200100 0 -100

YS-LA (4-8) CH 4 100 0 -100

YS-KP (4-9) CH 4

Degrees

200 100 0 -100

YS-NL (4-10) CH 4

200100 0 -100

YS-FD (4-11) CH 4

200100 0 -100

YS-OV (4-12) CH 4

200100 0 -100

YS-BR (4-13) CH 4

200100 0 -100

YS-HN (4-14) CH 4

200100 0 -100

YS-SC (4-15) CH 4

Time (hours)

08 10 12 14 16 18 200 100 0 -100

YS-PT (4-17) CH 4

IF 2 CHAN 4 - 29 STK RR/LL

RatioPhas vs Time for GA032B.UVDATA.1 Vect aver. CL # 2 FG # 1

PLot file version1461 created 17-NOV-2014 17:15:19

200100 0 -100

EF-YS (1-4) CH 4

200100 0 -100

ON-YS (2-4) CH 4

200100 0 -100

YS-KY (4-5) CH 4

200100 0 -100

YS-KU (4-6) CH 4 200 100 0 -100

YS-KT (4-7) CH 4

200100 0 -100

YS-LA (4-8) CH 4 100 0 -100

YS-KP (4-9) CH 4

Degrees

200 100 0 -100

YS-NL (4-10) CH 4

200100 0 -100

YS-FD (4-11) CH 4

200100 0 -100

YS-OV (4-12) CH 4

200100 0 -100

YS-BR (4-13) CH 4

200100 0 -100

YS-HN (4-14) CH 4

200100 0 -100

YS-SC (4-15) CH 4

Time (hours)

08 10 12 14 16 18 200 100 0 -100

YS-PT (4-17) CH 4

IF 2 CHAN 4 - 29 STK RR/LL

RatioPhas vs Time for GA032B.UVDATA.1 Vect aver. CL # 2 FG # 1

PLot file version1462 created 17-NOV-2014 17:16:28

200 150 100 50 0 -50 -100 -150

EF-YS (1-4) CH 4

Degrees

Time (hours)

08 10 12 14 16 18

250 200 150 100 50 0 -50 -100 -150

ON-YS (2-4) CH 4

IF 2 CHAN 4 - 29 STK RR/LL

RatioPhas vs Time for GA032B.UVDATA.1 Vect aver. CL # 2 FG # 1

PLot file version1463 created 17-NOV-2014 17:16:28

250 200 150 100 50 0 -50 -100 -150

YS-KY (4-5) CH 4

Degrees

Time (hours)

08 10 12 14 16 18

250 200 150 100 50 0 -50 -100 -150

YS-KU (4-6) CH 4

IF 2 CHAN 4 - 29 STK RR/LL

RatioPhas vs Time for GA032B.UVDATA.1 Vect aver. CL # 2 FG # 1

PLot file version1464 created 17-NOV-2014 17:16:28

200 150 100 50 0 -50 -100 -150

YS-KT (4-7) CH 4

Degrees

Time (hours)

08 10 12 14 16 18

250 200 150 100 50 0 -50 -100 -150

YS-LA (4-8) CH 4

IF 2 CHAN 4 - 29 STK RR/LL

RatioPhas vs Time for GA032B.UVDATA.1 Vect aver. CL # 2 FG # 1

PLot file version1465 created 17-NOV-2014 17:16:28

150 100 50 0 -50 -100 -150

YS-KP (4-9) CH 4

Degrees

Time (hours)

08 10 12 14 16 18

200 150 100 50 0 -50 -100

YS-NL (4-10) CH 4

IF 2 CHAN 4 - 29 STK RR/LL

RatioPhas vs Time for GA032B.UVDATA.1 Vect aver. CL # 2 FG # 1

PLot file version1466 created 17-NOV-2014 17:16:28

250 200 150 100 50 0 -50 -100 -150

YS-FD (4-11) CH 4

Degrees

Time (hours)

08 10 12 14 16 18

250 200 150 100 50 0 -50 -100 -150

YS-OV (4-12) CH 4

IF 2 CHAN 4 - 29 STK RR/LL

RatioPhas vs Time for GA032B.UVDATA.1 Vect aver. CL # 2 FG # 1

PLot file version1467 created 17-NOV-2014 17:16:28

200 150 100 50 0 -50 -100 -150

YS-BR (4-13) CH 4

Degrees

Time (hours)

08 10 12 14 16 18

250 200 150 100 50 0 -50 -100 -150

YS-HN (4-14) CH 4

IF 2 CHAN 4 - 29 STK RR/LL

RatioPhas vs Time for GA032B.UVDATA.1 Vect aver. CL # 2 FG # 1

PLot file version1468 created 17-NOV-2014 17:16:28

250 200 150 100 50 0 -50 -100 -150

YS-SC (4-15) CH 4

Degrees

Time (hours)

08 10 12 14 16 18

200 150 100 50 0 -50 -100 -150

YS-PT (4-17) CH 4