Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 1 created 16-FEB-2006 09:58:27

1 EF IF 1R

1.00 0.99 0.98 0.97

1 EF IF 1L

1.03 1.02 1.01 1.00

1 EF IF 2R

0.99 0.98 0.97 0.96

1 EF IF 2L

1.04 1.03 1.02 1.01

1 EF IF 3R

0.99 0.98 0.97 0.96

1 EF IF 3L

Gain

1.05 1.04 1.03 1.02 1.01

1 EF IF 4R

0.99 0.98 0.97 0.96 0.95

1 EF IF 4L

1.04

1.02

1.00 2 WB IF 1R

1.09 1.08 1.07 1.06

2 WB IF 1L

TIME (HOURS)

15 45 46 47 48 49 50 51 52 53 54

1.07 1.06 1.05 1.04 1.03

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 2 created 16-FEB-2006 09:58:27

2 WB IF 2R

0.97 0.96 0.95 0.94

2 WB IF 2L

0.94 0.93 0.92 0.91

2 WB IF 3R

1.04 1.03 1.02 1.01

2 WB IF 3L

1.02 1.01 1.00

2 WB IF 4R

1.05 1.04 1.03 1.02

2 WB IF 4L

Gain

1.04 1.03 1.02

3 JB IF 1R

1.585 1.580 1.575 1.570

3 JB IF 1L

1.560 1.555 1.550 1.545 3 JB IF 2R

1.645 1.640 1.635 1.630 3 JB IF 2L

TIME (HOURS)

15 45 46 47 48 49 50 51 52 53 54

2.030 2.025 2.020 2.015

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 3 created 16-FEB-2006 09:58:27

3 JB IF 3R

1.665 1.660 1.655 1.650 3 JB IF 3L

1.655 1.650 1.645 1.640

3 JB IF 4R

1.690 1.685 1.680 1.675

3 JB IF 4L

1.675 1.670 1.665 1.660 4 ON IF 1R

0.91 0.90 0.89

4 ON IF 1L

Gain

0.91

0.90 0.89 4 ON IF 2R

0.92 0.91 0.90 0.89 4 ON IF 2L

0.91 0.90 0.89 0.88

4 ON IF 3R

0.94

0.92

0.90 4 ON IF 3L

TIME (HOURS)

15 45 46 47 48 49 50 51 52 53 54

0.92 0.91 0.90 0.89

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 4 created 16-FEB-2006 09:58:27

4 ON IF 4R

0.94 0.92 0.90

4 ON IF 4L

0.92

0.90

0.88

5 MC IF 1R

1.00 0.99 0.98

5 MC IF 1L

1.02

1.00

0.98

5 MC IF 2R

1.01 1.00 0.99

5 MC IF 2L

Gain

0.995 0.990 0.985 0.980 5 MC IF 3R

1.00 0.99 0.98

5 MC IF 3L

1.02 1.01 1.00 0.99

5 MC IF 4R

1.02 1.01 1.00 0.99

5 MC IF 4L

TIME (HOURS)

15 45 46 47 48 49 50 51 52 53 54

1.015 1.010 1.005 1.000

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 5 created 16-FEB-2006 09:58:27

7 PT IF 1R

1.035 1.030 1.025 1.020 1.015

7 PT IF 1L

1.01

1.00

0.99

7 PT IF 2R

1.03

1.02

1.01

7 PT IF 2L

1.010 1.005 1.000 0.995

7 PT IF 3R

1.02

1.01

1.00

7 PT IF 3L

Gain

1.00

0.99

0.98

7 PT IF 4R

0.97

0.96

0.95

7 PT IF 4L

1.01

1.00

0.99

9 LA IF 1R

0.985 0.980 0.975 0.970 0.965

9 LA IF 1L

TIME (HOURS)

15 45 46 47 48 49 50 51 52 53 54

1.01 1.00 0.99

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 6 created 16-FEB-2006 09:58:27

9 LA IF 2R

1.015 1.010 1.005 1.000 0.995

9 LA IF 2L

0.99

0.98

0.97

9 LA IF 3R

1.02 1.01 1.00 0.99

9 LA IF 3L

0.975 0.970 0.965 0.960 0.955

9 LA IF 4R

1.000 0.995 0.990 0.985

9 LA IF 4L

Gain

0.980 0.975 0.970 0.965

10 BR IF 2L

4.680 4.675 4.670 4.665

11 FD IF 1R

1.01 1.00 0.99 0.98 0.97

11 FD IF 1L

1.01 1.00 0.99 0.98 0.97

11 FD IF 2R

TIME (HOURS)

15 45 46 47 48 49 50 51 52 53 54

1.04 1.03 1.02 1.01

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 7 created 16-FEB-2006 09:58:27

11 FD IF 2L

1.02 1.01 1.00 0.99

11 FD IF 3R

1.00 0.99 0.98 0.97

11 FD IF 3L

0.98 0.97 0.96

11 FD IF 4R

0.99 0.98 0.97 0.96

11 FD IF 4L

0.98 0.97 0.96 0.95

12 SC IF 1R

Gain

1.3 1.2 1.1 1.0 12 SC IF 1L 1.2 1.1 1.0 12 SC IF 2R 1.2 1.1 1.0 12 SC IF 2L 1.2 1.1 1.0 12 SC IF 3R

TIME (HOURS)

15 45 46 47 48 49 50 51 52 53 54

1.2 1.1 1.0

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 8 created 16-FEB-2006 09:58:27

12 SC IF 3L 1.2 1.1 1.0 12 SC IF 4R 1.2 1.1 1.0 12 SC IF 4L 1.2 1.1 1.0 13 NL IF 1R

0.96 0.95 0.94 0.93

13 NL IF 1L

0.98 0.97 0.96

13 NL IF 2R

Gain

0.97

0.96

0.95

13 NL IF 2L

1.00

0.99

0.98

13 NL IF 3R

0.995 0.990 0.985 0.980 0.975

13 NL IF 3L

0.985 0.980 0.975 0.970

13 NL IF 4R

TIME (HOURS)

15 45 46 47 48 49 50 51 52 53 54

0.990 0.985 0.980 0.975

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 9 created 16-FEB-2006 09:58:27

13 NL IF 4L

0.965 0.960 0.955 0.950 0.945

14 OV IF 1R

1.03 1.02 1.01 1.00 0.99

14 OV IF 1L

1.03 1.02 1.01 1.00 0.99

14 OV IF 2R

1.05 1.04 1.03 1.02 1.01

14 OV IF 2L

1.02 1.01 1.00

14 OV IF 3R

Gain

0.985 0.980 0.975 0.970

14 OV IF 3L

0.985 0.980 0.975 0.970 0.965

14 OV IF 4R

0.995 0.990 0.985 0.980 0.975

14 OV IF 4L

1.00

0.99

0.98

16 HN IF 1R

TIME (HOURS)

15 45 46 47 48 49 50 51 52 53 54

0.95 0.94 0.93 0.92 0.91

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 10 created 16-FEB-2006 09:58:27

16 HN IF 1L

1.04 1.02 1.00

16 HN IF 2R

0.94 0.93 0.92 0.91

16 HN IF 2L

1.06

1.04

1.02

16 HN IF 3R

1.00 0.99 0.98 0.97

16 HN IF 3L

1.04

1.02

1.00

16 HN IF 4R

Gain

1.02 1.01 1.00 0.99

16 HN IF 4L

TIME (HOURS)

15 45 46 47 48 49 50 51 52 53 54

1.01 1.00 0.99 0.98 0.97