Gain amp vs UTC time for J1310+322.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 1 created 16-FEB-2006 09:58:57

1 EF IF 1R

1000 990 980 1 EF IF 1L 985 980 975 970 1 EF IF 2R 966 964 962 960 958 1 EF IF 2L 970 960 950 1 EF IF 3R 975 970 965 960 1 EF IF 3L

MilliGain

975 970 965 960 1 EF IF 4R 985 980 975 970 965 1 EF IF 4L 985 980 975 2 WB IF 1R

1100

1090

1080

2 WB IF 1L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00

1075 1070 1065 1060 1055

Gain amp vs UTC time for J1310+322.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 2 created 16-FEB-2006 09:58:57

2 WB IF 2R 990 985 980 2 WB IF 2L 970 960 950 2 WB IF 3R

1040

1030

1020 2 WB IF 3L

1035 1030 1025 1020 2 WB IF 4R

1055 1050 1045 1040 1035 2 WB IF 4L

MilliGain

1050 1045 1040 3 JB IF 1R 840 820 800 780 3 JB IF 1L 820 800 780 3 JB IF 2R 860 840 820 3 JB IF 2L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00

1060 1040 1020 1000

Gain amp vs UTC time for J1310+322.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 3 created 16-FEB-2006 09:58:57

3 JB IF 3R 860 840 820 3 JB IF 3L 860 840 820 3 JB IF 4R 880 860 840 3 JB IF 4L 880 860 840 4 ON IF 1R

1030 1020 1010

4 ON IF 1L

MilliGain

1025 1020 1015 1010 1005 4 ON IF 2R

1060

1040

1020 4 ON IF 2L

1040

1020

1000 4 ON IF 3R

1040 1030 1020 1010 4 ON IF 3L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00

1020 1010 1000 990

Gain amp vs UTC time for J1310+322.MULTI.1 SN 2 Rpol & Lpol IF 1 - 4

Plot file version 4 created 16-FEB-2006 09:58:57

4 ON IF 4R

1040 1030 1020 1010 4 ON IF 4L

1010 1000 990 980 5 MC IF 1R

1005 1000 995 990 985 5 MC IF 1L

1022 1020 1018 1016 1014 5 MC IF 2R

1020 1015

5 MC IF 2L

MilliGain

1040 1030 1020

5 MC IF 3R

1005 1000 995 5 MC IF 3L

1020 1015 1010 5 MC IF 4R

1020 1010 1000

5 MC IF 4L

TIME (HOURS)

06 08 10 12 14 16 18 20 22 1/00

1025 1020 1015