Center at RA 13 10 28.66385 DEC 32 20 43.7830

CONT: J1310+32 IPOL 4989.302 MHZ J1310+322.ICL001.2

PLot file version 1 created 16-FEB-2006 09:58:55

Cont peak flux = 1.4823E+00 JY/BEAM Levs = 1.482E-02 * (-1.42, 1.425, 2.849, 5.698, 11.40, 22.79, 45.58, 91.17)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

50

0

-50

-100