Center at RA 13 44 42.14200 DEC 55 53 13.1500

CONT: MKN273 IPOL 4989.302 MHZ MKN273.ICL001.1

PLot file version 1 created 16-FEB-2006 09:55:39

Cont peak flux = -1.1840E-04 JY/BEAM Levs = 1.184E-06 * (-70.6, 70.61)

MilliARC SEC

MilliARC SEC

60 40 20 0 -20 -40 -60

60

40

20

0

-20

-40

-60