Center at RA 13 37 49.64222 DEC 55 01 02.1179

CONT: J1337+55 IPOL 1415.303 MHZ J1337+550.ICL001.1

PLot file version 1 created 21-FEB-2006 13:10:57

Cont peak flux = 5.4855E-01 JY/BEAM Levs = 5.486E-03 * (-0.597, 0.597, 1.194, 2.387, 4.775, 9.549, 19.10, 38.20, 76.39)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250