Center at RA 14 07 00.39441 DEC 28 27 14.6902

CONT: OQ208 IPOL 1415.303 MHZ OQ208.ICL001.3

PLot file version 1 created 21-FEB-2006 13:11:46

Cont peak flux = 5.4619E-01 JY/BEAM Levs = 5.462E-03 * (-1.46, 1.465, 2.929, 5.859, 11.72, 23.44, 46.87, 93.74)

MilliARC SEC

MilliARC SEC

300 200 100 0 -100 -200 -300

300

200

100

0

-100

-200

-300