Center at RA 02 57 45.62877 DEC 18 47 05.3562

CONT: J0257+18 IPOL 1415.006 MHZ J0257+1847.ICL001.5

PLot file version 1 created 10-AUG-2005 12:26:36

Cont peak flux = 1.1060E-01 JY/BEAM Levs = 1.106E-01 * (-0.025, 0.025, 0.049, 0.098, 0.197, 0.394, 0.787)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250