Center at RA 02 37 52.40570 DEC 28 48 08.9890

CONT: 0234+285 IPOL 1408.100 MHZ 0234+285.ICL001.5

PLot file version 1 created 10-AUG-2005 18:48:18

Cont peak flux = 1.1969E+00 JY/BEAM Levs = 1.197E+00 * (-0.021, 0.021, 0.042, 0.083, 0.167, 0.334, 0.667)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250