Center at RA 02 55 17.10400 DEC 20 58 57.2100

CONT: IRAS0252 IPOL 1408.100 MHZ IRAS02524.ICL001.5

PLot file version 1 created 10-AUG-2005 18:49:12

Cont peak flux = 5.3622E-04 JY/BEAM Levs = 5.362E-04 * (-0.165, 0.165, 0.330, 0.661)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250