Gain amp vs UTC time for OQ208.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 05-FEB-2003 15:23:49

1R EB

1.005 1.000 0.995 0.990

2R MC

1.160 1.155 1.150 1.145 4R JB

0.850 0.845 0.840 0.835

5R WB

1.005 1.000 0.995 0.990

6R TR

1.945 1.940 1.935 1.930 7R NT

Gain

1.160 1.155 1.150 1.145

8R PT

0.98

0.96

0.94

9R KP 1.10 1.05 1.00

10R LA

0.94 0.92 0.90 0.88 0.86

11R BR

TIME (HOURS)

00 02 04 06 08 10 12 14 16

0.95 0.90 0.85 0.80

Gain amp vs UTC time for OQ208.MULTI.1 SN 2 Rpol IF 1

Plot file version 2 created 05-FEB-2003 15:23:49

12R FD 1.2 1.1 1.0 0.9 13R SC

1.02 1.00 0.98 0.96

14R NL

1.00 0.95 0.90 0.85

15R OV 1.0 0.9 0.8 0.7 16R HN

Gain

TIME (HOURS)

00 02 04 06 08 10 12 14 16

0.99 0.98 0.97 0.96

Gain amp vs UTC time for OQ208.MULTI.1 SN 2 Rpol IF 2

Plot file version 3 created 05-FEB-2003 15:23:50

1R EB

0.970 0.965 0.960 0.955

2R MC

1.080 1.075 1.070 1.065

4R JB

1.115 1.110 1.105 1.100 5R WB

1.015 1.010 1.005 1.000

6R TR

2.000 1.995 1.990 1.985

7R NT

Gain

1.075 1.070 1.065 1.060

8R PT

0.98

0.96

0.94 9R KP

1.05 1.00 0.95

10R LA

1.00 0.95 0.90

11R BR

TIME (HOURS)

00 02 04 06 08 10 12 14 16

1.0 0.8 0.6

Gain amp vs UTC time for OQ208.MULTI.1 SN 2 Rpol IF 2

Plot file version 4 created 05-FEB-2003 15:23:50

12R FD 1.3 1.2 1.1 1.0 13R SC

0.94 0.92 0.90 0.88

14R NL

0.94 0.92 0.90 0.88 15R OV

0.94 0.92 0.90 0.88 16R HN

Gain

TIME (HOURS)

00 02 04 06 08 10 12 14 16

0.98

0.97

0.96

Gain amp vs UTC time for OQ208.MULTI.1 SN 2 Lpol IF 1

Plot file version 5 created 05-FEB-2003 15:23:50

1L EB

1025 1020 1015 1010

2L MC 900 895 890 885 4L JB

1055 1050 1045 1040

5L WB 950 945 940 935 6L TR 680 675 670 665 7L NT

MilliGain

925 920 915 910 8L PT

1000 900 800 9L KP

1150 1100 1050 1000

10L LA

1020 1000 980 960 940 920 11L BR

TIME (HOURS)

00 02 04 06 08 10 12 14 16

1100 1000 900 800 700

Gain amp vs UTC time for OQ208.MULTI.1 SN 2 Lpol IF 1

Plot file version 6 created 05-FEB-2003 15:23:50

12L FD

1100

1000 900 13L SC

1100 1000 900 14L NL

1120 1100 1080 1060 1040 1020

15L OV

1050 1000 950 16L HN

MilliGain

TIME (HOURS)

00 02 04 06 08 10 12 14 16

1000 980 960

Gain amp vs UTC time for OQ208.MULTI.1 SN 2 Lpol IF 2

Plot file version 7 created 05-FEB-2003 15:23:50

1L EB

1030 1025 1020 1015

2L MC 860 855 850 845 4L JB

1110 1105 1100 1095

5L WB

1065 1060 1055 1050

6L TR 605 600 595 590 7L NT

MilliGain

990 985 980 975 8L PT

1000 900 800 9L KP

1050

1000 950 10L LA 1000 950 900 11L BR

TIME (HOURS)

00 02 04 06 08 10 12 14 16

1000 950 900

Gain amp vs UTC time for OQ208.MULTI.1 SN 2 Lpol IF 2

Plot file version 8 created 05-FEB-2003 15:23:50

12L FD

1300 1200 1100 1000

13L SC 960 950 940 930 14L NL

1020 1000 980 960 15L OV

1080 1060 1040 1020

16L HN

MilliGain

TIME (HOURS)

00 02 04 06 08 10 12 14 16

1070 1065 1060 1055

Gain amp vs UTC time for J1453+2648.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 05-FEB-2003 15:28:22

1R EB 10 5 0 2R MC 5 4 3 2 1 4R JB 15 10 5 0 5R WB 8 6 4 2 0 6R TR 10 5 0 7R NT

Gain

10 5 0 8R PT 5 4 3 2 1 9R KP 2.5 2.0 1.5 1.0 0.5 10R LA 1.5 1.0 0.5 11R BR

TIME (HOURS)

00 02 04 06 08 10 12 14 16

2.0 1.5 1.0 0.5

Gain amp vs UTC time for J1453+2648.MULTI.1 SN 2 Rpol IF 1

Plot file version 2 created 05-FEB-2003 15:28:22

12R FD

1.21.0 0.80.6 0.4 0.2 13R SC 3 2 1 14R NL 1.4 1.2 1.0 0.8 0.6 15R OV 2.0 1.5 1.0 0.5 16R HN

Gain

TIME (HOURS)

00 02 04 06 08 10 12 14 16

1.2 1.0 0.8 0.6 0.4

Gain amp vs UTC time for J1453+2648.MULTI.1 SN 2 Rpol IF 2

Plot file version 3 created 05-FEB-2003 15:28:22

1R EB 15 10 5 0 2R MC 5 4 3 2 4R JB 200 100 0 5R WB 2 1 0 6R TR 6 4 2 0 7R NT

Gain

15 10 5 0 8R PT 1.5 1.0 0.5 9R KP 1.5 1.0 0.5 10R LA 2.0 1.5 1.0 0.5 11R BR

TIME (HOURS)

00 02 04 06 08 10 12 14 16

3 2 1

Gain amp vs UTC time for J1453+2648.MULTI.1 SN 2 Rpol IF 2

Plot file version 4 created 05-FEB-2003 15:28:22

12R FD 15 10 5 0 13R SC 2.5 2.0 1.5 1.0 0.5 14R NL 1.5 1.0 0.5 15R OV 2.0 1.5 1.0 0.5 16R HN

Gain

TIME (HOURS)

00 02 04 06 08 10 12 14 16

3 2 1 0

Gain amp vs UTC time for J1453+2648.MULTI.1 SN 2 Lpol IF 2

Plot file version 7 created 05-FEB-2003 15:28:23

1L EB 15 10 5 0 2L MC 10 5 0 4L JB 150 100 50 0 5L WB 2 1 0 6L TR 0.6 0.4 0.2 7L NT

Gain

15 10 5 0 8L PT 2.0 1.5 1.0 0.5 9L KP 2.0 1.5 1.0 0.5 10L LA 2.0 1.5 1.0 0.5 11L BR

TIME (HOURS)

00 02 04 06 08 10 12 14 16

3 2 1

Gain amp vs UTC time for J1453+2648.MULTI.1

SN 2 Lpol IF 2

Plot file version 8 created 05-FEB-2003 15:28:23

12L FD 5 4 3 2 1 13L SC 2.5 2.0 1.5 1.0 0.5 14L NL 3 2 1 15L OV 1.4 1.2 1.0 0.8 0.6 16L HN

Gain

TIME (HOURS)

00 02 04 06 08 10 12 14 16

1.5 1.0 0.5