Gain phs vs UTC time for OQ208.MULTI.1 SN 1 Rpol IF 1

Plot file version 1 created 05-FEB-2003 15:22:32

1R EB

0.010 0.005 0.000 -0.005

2R MC

0.290 0.285 0.280 0.275 4R JB

-0.040 -0.045 -0.050 -0.055 5R WB

-0.705 -0.710 -0.715 -0.720 6R TR

0.440 0.435 0.430 0.425 7R NT

Degrees

-2.665 -2.670 -2.675 -2.680

8R PT 0 -2 -4 -6 9R KP 100 50 0 10R LA 20 10 0 11R BR

TIME (HOURS)

00 02 04 06 08 10 12 14 16

0.0 -0.5 -1.0 -1.5

Gain phs vs UTC time for OQ208.MULTI.1 SN 1 Rpol IF 1

Plot file version 2 created 05-FEB-2003 15:22:32

12R FD 100 0 -100 13R SC 3 2 1 0 -1 14R NL 0 -20 -40 15R OV 40 20 0 16R HN

Degrees

TIME (HOURS)

00 02 04 06 08 10 12 14 16

0 -1 -2

Gain phs vs UTC time for OQ208.MULTI.1 SN 1 Rpol IF 2

Plot file version 3 created 05-FEB-2003 15:22:32

1R EB

0.010 0.005 0.000 -0.005

2R MC

-0.305 -0.310 -0.315 -0.320

4R JB

0.200 0.195 0.190 0.185

5R WB

-0.795 -0.800 -0.805 -0.810

6R TR

-1.160 -1.165 -1.170 -1.175 7R NT

Degrees

-0.455 -0.460 -0.465 -0.470

8R PT 2 0 -2-4 -6 9R KP 60 40 20 0 10R LA 15 10 5 0 11R BR

TIME (HOURS)

00 02 04 06 08 10 12 14 16

0 -2 -4

Gain phs vs UTC time for OQ208.MULTI.1 SN 1 Rpol IF 2

Plot file version 4 created 05-FEB-2003 15:22:32

12R FD 0 -50 -100 -150

13R SC 3.0 2.5 2.0 14R NL 2 0 -2 15R OV 2 0 -2 16R HN

Degrees

TIME (HOURS)

00 02 04 06 08 10 12 14 16

1 0 -1 -2

Gain phs vs UTC time for OQ208.MULTI.1 SN 1 Lpol IF 1

Plot file version 5 created 05-FEB-2003 15:22:32

1L EB

0.010 0.005 0.000 -0.005

2L MC

-0.195 -0.200 -0.205 -0.210

4L JB

-0.080 -0.085 -0.090 -0.095

5L WB

-0.210 -0.215 -0.220 -0.225

6L TR

0.515 0.510 0.505 0.500

7L NT

Degrees

-1.625 -1.630 -1.635 -1.640

8L PT 5 0 -5 9L KP 150 100 50 0 10L LA 0 -10 -20 11L BR

TIME (HOURS)

00 02 04 06 08 10 12 14 16

60 40 20 0

Gain phs vs UTC time for OQ208.MULTI.1 SN 1 Lpol IF 1

Plot file version 6 created 05-FEB-2003 15:22:32

12L FD 50 0 -50 -100

13L SC 0 -50 -100 -150

14L NL 6 4 2 0 -2 15L OV 3 2 1 0 -1 16L HN

Degrees

TIME (HOURS)

00 02 04 06 08 10 12 14 16

10 5 0 -5

Gain phs vs UTC time for OQ208.MULTI.1 SN 1 Lpol IF 2

Plot file version 7 created 05-FEB-2003 15:22:32

1L EB

0.010 0.005 0.000 -0.005

2L MC

-1.020 -1.025 -1.030 -1.035

4L JB

-0.040 -0.045 -0.050 -0.055

5L WB

-0.080 -0.085 -0.090 -0.095

6L TR

-0.210 -0.215 -0.220 -0.225

7L NT

Degrees

-0.575 -0.580 -0.585 -0.590

8L PT 5 0 -5 9L KP 0 -50 -100

10L LA 30 20 10 0 11L BR

TIME (HOURS)

00 02 04 06 08 10 12 14 16

4 2 0 -2 -4

Gain phs vs UTC time for OQ208.MULTI.1 SN 1 Lpol IF 2

Plot file version 8 created 05-FEB-2003 15:22:32

12L FD 0 -50 -100 -150

13L SC 3 2 1 0 14L NL 5 0 15L OV 3 2 1 0 -1 16L HN

Degrees

TIME (HOURS)

00 02 04 06 08 10 12 14 16

5 0 -5

Gain phs vs UTC time for J1453+2648.MULTI.1 SN 1 Rpol IF 1

Plot file version 1 created 05-FEB-2003 15:27:07

1R EB

0.010 0.005 0.000 -0.005

2R MC 200 0 -200

4R JB 100 0 -100

5R WB 100 0 -100 -200

6R TR 200 0 -200

7R NT

Degrees

200 0 -200

8R PT 200 0 -200

9R KP 300 200 100 0 10R LA 100 0 -100 -200

11R BR

TIME (HOURS)

00 02 04 06 08 10 12 14 16

200 0 -200

Gain phs vs UTC time for J1453+2648.MULTI.1 SN 1 Rpol IF 1

Plot file version 2 created 05-FEB-2003 15:27:07

12R FD 100 0 -100

13R SC 300 200 100 0 14R NL 100 0 -100

15R OV 200 100 0 -100

16R HN

Degrees

TIME (HOURS)

00 02 04 06 08 10 12 14 16

100 0 -100 -200

Gain phs vs UTC time for J1453+2648.MULTI.1 SN 1 Rpol IF 2

Plot file version 3 created 05-FEB-2003 15:27:07

1R EB

0.010 0.005 0.000 -0.005

2R MC 200 0 -200

4R JB 200 0 -200

5R WB 200 100 0 -100

6R TR 100 0 -100

7R NT

Degrees

200 0 -200

8R PT 200 0 -200

9R KP 200 100 0 -100

10R LA 200 0 -200

11R BR

TIME (HOURS)

00 02 04 06 08 10 12 14 16

200 0 -200

Gain phs vs UTC time for J1453+2648.MULTI.1 SN 1 Rpol IF 2

Plot file version 4 created 05-FEB-2003 15:27:07

12R FD 200 0 -200

13R SC 200 100 0 -100

14R NL 200 100 0 -100

15R OV 100 0 -100 -200

16R HN

Degrees

TIME (HOURS)

00 02 04 06 08 10 12 14 16

200 100 0 -100

Gain phs vs UTC time for J1453+2648.MULTI.1 SN 1 Lpol IF 2

Plot file version 7 created 05-FEB-2003 15:27:07

1L EB

0.010 0.005 0.000 -0.005

2L MC 200 0 -200 4L JB 200 0 -200 5L WB 200 0 -200 6L TR 200 0 -200 7L NT

Degrees

300 200 100 0 8L PT 200 0 -200 9L KP 100 0 -100

10L LA 200 100 0 -100

11L BR

TIME (HOURS)

00 02 04 06 08 10 12 14 16

100 0 -100

Gain phs vs UTC time for J1453+2648.MULTI.1 SN 1 Lpol IF 2

Plot file version 8 created 05-FEB-2003 15:27:08

12L FD 200 100 0 -100

13L SC 100 0 -100 -200 14L NL 100 0 -100

15L OV 100 0 -100 -200 16L HN

Degrees

TIME (HOURS)

00 02 04 06 08 10 12 14 16

200 0 -200