Center at RA 14 53 53.60610 DEC 26 48 33.4720

CONT: J1453+26 IPOL 1656.365 MHZ J1453+2648.ICL001.3

PLot file version 1 created 05-FEB-2003 15:29:05

Cont peak flux = -2.4697E-01 JY/BEAM Levs = 2.038E-01 * (-0.389, 0.389, 0.778)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250