Gain amp vs UTC time for 2145+067.MULTI.1 SN 2 Rpol & Lpol IF 1 - 3

Plot file version 1 created 13-DEC-2004 17:31:20

1 EF IF 1R 1.0 0.9 0.8 1 EF IF 1L

0.95 0.90 0.85 0.80

1 EF IF 2R

1.05 1.00 0.95 0.90 0.85 1 EF IF 2L 1.0 0.9 0.8 1 EF IF 3R 1.0 0.9 0.8 1 EF IF 3L

Gain

1.0 0.9 0.8 2 WB IF 1R 1.6 1.4 1.2 1.0 2 WB IF 1L 1.6 1.4 1.2 2 WB IF 2R 1.4 1.2 1.0 2 WB IF 2L

TIME (HOURS)

1/04 1/06 1/08 1/10 1/12 1/14

1.4 1.2 1.0

Gain amp vs UTC time for 2145+067.MULTI.1 SN 2 Rpol & Lpol IF 1 - 3

Plot file version 2 created 13-DEC-2004 17:31:20

2 WB IF 3R 1.3 1.2 1.1 1.0 0.9 2 WB IF 3L 1.3 1.2 1.1 1.0 0.9 3 MC IF 1R 1.2 1.1 1.0 3 MC IF 1L

1.10 1.05 1.00 0.95

3 MC IF 2R 1.6 1.4 1.2 3 MC IF 2L

Gain

1.05 1.00 0.95 0.90 0.85

3 MC IF 3R

1.15 1.10 1.05 1.00 0.95 3 MC IF 3L

1.00 0.95 0.90 0.85

4 NT IF 1R 1.2 1.1 1.0 4 NT IF 1L

TIME (HOURS)

1/04 1/06 1/08 1/10 1/12 1/14

1.25 1.20 1.15 1.10 1.05

Gain amp vs UTC time for 2145+067.MULTI.1 SN 2 Rpol & Lpol IF 1 - 3

Plot file version 3 created 13-DEC-2004 17:31:20

4 NT IF 2R 1.1 1.0 0.9 4 NT IF 2L 1.1 1.0 0.9 4 NT IF 3R 1.4 1.3 1.2 4 NT IF 3L 1.3 1.2 1.1 1.0 5 TR IF 1R

0.55 0.50 0.45

5 TR IF 1L

Gain

0.42 0.40 0.38 0.36 5 TR IF 2R

0.55

0.50

0.45 5 TR IF 2L 1.0 0.9 0.8 5 TR IF 3R

0.56 0.54 0.52 0.50 0.48 5 TR IF 3L

TIME (HOURS)

1/04 1/06 1/08 1/10 1/12 1/14

0.65 0.60 0.55

Gain amp vs UTC time for 2145+067.MULTI.1 SN 2 Rpol & Lpol IF 1 - 3

Plot file version 4 created 13-DEC-2004 17:31:20

6 HH IF 1R 1.3 1.2 1.1 6 HH IF 1L

1.30 1.25 1.20 1.15

6 HH IF 2R 1.2 1.1 1.0 6 HH IF 2L 1.2 1.1 1.0 6 HH IF 3R 1.2 1.1 1.0 6 HH IF 3L

Gain

1.4 1.3 1.2 1.1 7 JB IF 1R

0.98 0.96 0.94

7 JB IF 2R

1.00 0.98 0.96

7 JB IF 2L

1.04 1.02 1.00

7 JB IF 3R

TIME (HOURS)

1/04 1/06 1/08 1/10 1/12 1/14

1.02 1.00 0.98 0.96

Gain amp vs UTC time for 2145+067.MULTI.1 SN 2 Rpol & Lpol IF 1 - 3

Plot file version 5 created 13-DEC-2004 17:31:20

7 JB IF 3L

1.10

1.05

1.00

8 SC IF 1R

1.05 1.00 0.95 0.90 0.85

8 SC IF 1L

1.05

1.00

0.95

0.90

8 SC IF 2R

1.05 1.00 0.95 0.90 0.85

8 SC IF 2L 1.1 1.0 0.9 8 SC IF 3R

Gain

1.1 1.0 0.9 0.8 8 SC IF 3L 6.0 5.5 5.0 4.5 9 HN IF 1R

1.15 1.10 1.05 1.00 0.95

9 HN IF 1L

1.25 1.20 1.15 1.10

9 HN IF 2R

TIME (HOURS)

1/04 1/06 1/08 1/10 1/12 1/14

1.05 1.00 0.95 0.90

Gain amp vs UTC time for 2145+067.MULTI.1 SN 2 Rpol & Lpol IF 1 - 3

Plot file version 6 created 13-DEC-2004 17:31:20

9 HN IF 2L 1.2 1.1 1.0 9 HN IF 3R 1.1 1.0 0.9 9 HN IF 3L 1.2 1.1 1.0 0.9 10 NL IF 1R

1.06

1.04

1.02

10 NL IF 1L

1.04

1.02

1.00

10 NL IF 2R

Gain

1.04 1.02 1.00 0.98 0.96

10 NL IF 2L

1.00 0.98 0.96 0.94

10 NL IF 3R

1.02 1.00 0.98 0.96

10 NL IF 3L

1.04 1.02 1.00 0.98

11 FD IF 1R

TIME (HOURS)

1/04 1/06 1/08 1/10 1/12 1/14

1.15 1.10 1.05 1.00 0.95

Gain amp vs UTC time for 2145+067.MULTI.1 SN 2 Rpol & Lpol IF 1 - 3

Plot file version 7 created 13-DEC-2004 17:31:20

11 FD IF 1L 1.2 1.1 1.0 11 FD IF 2R 1.0 0.9 0.8 0.7 11 FD IF 2L

1.10 1.05 1.00 0.95

11 FD IF 3R 1.1 1.0 0.9 0.8 0.7 11 FD IF 3L 1.2 1.1 1.0 0.9 12 LA IF 1R

Gain

1.15 1.10 1.05 1.00 0.95

12 LA IF 1L

1.20 1.15 1.10 1.05

12 LA IF 2R 1.1 1.0 0.9 0.8 12 LA IF 2L

1.15 1.10 1.05 1.00 0.95

12 LA IF 3R

TIME (HOURS)

1/04 1/06 1/08 1/10 1/12 1/14

1.0 0.9 0.8 0.7

Gain amp vs UTC time for 2145+067.MULTI.1 SN 2 Rpol & Lpol IF 1 - 3

Plot file version 8 created 13-DEC-2004 17:31:20

12 LA IF 3L

1.05 1.00 0.95 0.90

13 PT IF 1R 1.0 0.9 0.8 13 PT IF 1L 1.1 1.0 0.9 13 PT IF 2R 1.1 1.0 0.9 0.8 13 PT IF 2L 1.1 1.0 0.9 13 PT IF 3R

Gain

1.1 1.0 0.9 0.8 13 PT IF 3L 1.4 1.2 1.0 0.8 14 KP IF 1R

1.00

0.98

0.96

14 KP IF 1L

1.005 1.000 0.995

14 KP IF 2R

TIME (HOURS)

1/04 1/06 1/08 1/10 1/12 1/14

0.962 0.960 0.958 0.956 0.954 0.952

Gain amp vs UTC time for 2145+067.MULTI.1 SN 2 Rpol & Lpol IF 1 - 3

Plot file version 9 created 13-DEC-2004 17:31:20

14 KP IF 2L

0.95 0.94 0.93 0.92

14 KP IF 3R

0.95

0.90

14 KP IF 3L

0.98 0.96 0.94 0.92

15 OV IF 1R

0.860 0.855 0.850 0.845

15 OV IF 1L

0.945 0.940 0.935 0.930 0.925

15 OV IF 2R

Gain

0.812 0.810 0.808 0.806 0.804

15 OV IF 2L

0.93 0.92 0.91 0.90

15 OV IF 3R

0.82 0.80 0.78

15 OV IF 3L

0.90

0.88

0.86

16 BR IF 1R

TIME (HOURS)

1/04 1/06 1/08 1/10 1/12 1/14

1.12

1.10

1.08

Gain amp vs UTC time for 2145+067.MULTI.1 SN 2 Rpol & Lpol IF 1 - 3

Plot file version 10 created 13-DEC-2004 17:31:20

16 BR IF 1L

1.16 1.14 1.12 1.10

16 BR IF 2R

1.14 1.12 1.10

16 BR IF 2L

1.12 1.10 1.08 1.06

16 BR IF 3R

1.15 1.10 1.05

16 BR IF 3L

1.15 1.10 1.05 1.00

17 MK IF 1R

Gain

0.86 0.85 0.84

17 MK IF 1L

1.06 1.05 1.04 1.03

17 MK IF 2R

0.90 0.88 0.86 0.84

17 MK IF 2L

1.00 0.98 0.96 0.94

17 MK IF 3R

TIME (HOURS)

1/04 1/06 1/08 1/10 1/12 1/14

0.90

0.85

0.80

Gain amp vs UTC time for 2145+067.MULTI.1 SN 2 Rpol & Lpol IF 1 - 3

Plot file version 11 created 13-DEC-2004 17:31:20

17 MK IF 3L

Gain

TIME (HOURS)

1/04 1/06 1/08 1/10 1/12 1/14

0.95 0.90 0.85