Center at RA 17 51 32.81857 DEC 09 39 00.7284

CONT: OT081 IPOL 1619.502 MHZ OT081.IIM001.2

PLot file version 1 created 13-DEC-2004 17:29:06

Cont peak flux = 1.2867E+00 JY/BEAM Levs = 1.287E+00 * (-0.085, 0.085, 0.170, 0.340, 0.681)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250