Center at RA 21 48 05.45868 DEC 06 57 38.6042

CONT: 2145+067 IPOL 1611.700 MHZ 2145+067.IIM001.2

PLot file version 1 created 13-DEC-2004 19:46:03

Cont peak flux = 1.3303E+00 JY/BEAM Levs = 1.330E+00 * (-0.253, 0.253, 0.505)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250