Center at RA 18 32 43.47112 DEC 13 57 44.4003

CONT: 1830+139 IPOL 1619.572 MHZ 1830+139.ICL001.5

PLot file version 1 created 02-AUG-2005 13:26:28

Cont peak flux = 4.7511E-01 JY/BEAM Levs = 4.751E-01 * (-0.011, 0.011, 0.022, 0.043, 0.086, 0.173, 0.346, 0.691)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250