Gain amp vs UTC time for 1851+005.MULTI.1 SN 2 Rpol & Lpol IF 1 - 3

Plot file version 1 created 02-AUG-2005 13:24:29

1 EF IF 1R 2.0 1.5 1.0 1 EF IF 1L 1.6 1.4 1.2 1.0 0.8 0.6 1 EF IF 2R

1.00 0.95 0.90 0.85

1 EF IF 2L 1.2 1.0 0.8 0.6 1 EF IF 3R 1.6 1.4 1.2 1.0 0.8 0.6 1 EF IF 3L

Gain

2.5 2.0 1.5 1.0 0.5 2 WB IF 1R 1.6 1.4 1.2 1.0 2 WB IF 1L 2.0 1.5 1.0 2 WB IF 2R 1.1 1.0 0.9 0.8 0.7 2 WB IF 2L

TIME (HOURS)

03 00 30 04 00 30 05 00 30 06 00 30 07 00

1.6 1.4 1.2 1.0 0.8

Gain amp vs UTC time for 1851+005.MULTI.1 SN 2 Rpol & Lpol IF 1 - 3

Plot file version 2 created 02-AUG-2005 13:24:29

2 WB IF 3R 1.4 1.2 1.0 0.8 2 WB IF 3L 3 2 1 3 MC IF 1R 1.2 1.0 0.8 0.6 0.4 3 MC IF 1L 1.5 1.0 0.5 3 MC IF 2L

0.710 0.705 0.700 0.695

3 MC IF 3R

Gain

0.585 0.580 0.575 0.570 4 NT IF 1R

0.190 0.185 0.180 0.175 4 NT IF 1L

0.120 0.115 0.110 0.105 4 NT IF 3L 0.8 0.6 0.4 0.2 5 TR IF 1L

TIME (HOURS)

03 00 30 04 00 30 05 00 30 06 00 30 07 00

0.5 0.4 0.3

Gain amp vs UTC time for 1851+005.MULTI.1 SN 2 Rpol & Lpol IF 1 - 3

Plot file version 3 created 02-AUG-2005 13:24:29

5 TR IF 2R

1.210 1.205 1.200 1.195

5 TR IF 2L

1.080 1.075 1.070 1.065

5 TR IF 3R 1.0 0.9 0.8 0.7 5 TR IF 3L 1.5 1.0 0.5 6 HH IF 1R

0.28 0.26 0.24 0.22 0.20

6 HH IF 1L

Gain

0.370 0.365 0.360 0.355 6 HH IF 2R

0.32 0.30 0.28 0.26 0.24 0.22

6 HH IF 2L 1.0 0.8 0.6 0.4 6 HH IF 3R

0.510 0.505 0.500 0.495

6 HH IF 3L

TIME (HOURS)

03 00 30 04 00 30 05 00 30 06 00 30 07 00

1.6 1.4 1.2 1.0 0.8 0.6

Gain amp vs UTC time for 1851+005.MULTI.1 SN 2 Rpol & Lpol IF 1 - 3

Plot file version 4 created 02-AUG-2005 13:24:29

7 JB IF 1R 0.6 0.4 0.2 7 JB IF 2L 0.5 0.4 0.3 7 JB IF 3L

Gain

TIME (HOURS)

03 00 30 04 00 30 05 00 30 06 00 30 07 00

0.20 0.15 0.10