Gain amp vs UTC time for TXS1843.MULTI.1 SN 2 Rpol & Lpol IF 1 - 3

Plot file version 1 created 02-AUG-2005 13:25:15

1 EF IF 1R

1.045 1.040 1.035 1.030 1 EF IF 1L

1.05

1.00

1 EF IF 2R

1.00

0.95

1 EF IF 2L 1.0 0.9 0.8 0.7 1 EF IF 3R

0.98 0.96 0.94 0.92 0.90 0.88

1 EF IF 3L

Gain

0.95 0.90 0.85

2 WB IF 1R

1.080 1.075 1.070 1.065 2 WB IF 1L

1.08 1.06 1.04 1.02 1.00 0.98

2 WB IF 2R

1.00

0.95

2 WB IF 2L

TIME (HOURS)

07 00 10 20 30 40 50 08 00 10 20 30

1.2 1.1 1.0

Gain amp vs UTC time for TXS1843.MULTI.1 SN 2 Rpol & Lpol IF 1 - 3

Plot file version 2 created 02-AUG-2005 13:25:15

2 WB IF 3R

1.00 0.95 0.90 2 WB IF 3L

1.00 0.95 0.90 0.85 3 MC IF 1R

0.950 0.945 0.940 0.935 3 MC IF 1L 1.2 1.1 1.0 0.9 3 MC IF 2R 1.0 0.9 0.8 3 MC IF 2L

Gain

1.15 1.10 1.05

3 MC IF 3R

0.975 0.970 0.965 0.960 4 NT IF 2L

1.870 1.865 1.860 1.855

4 NT IF 3L

0.585 0.580 0.575 0.570 5 TR IF 1L

TIME (HOURS)

07 00 10 20 30 40 50 08 00 10 20 30

2.0 1.5 1.0

Gain amp vs UTC time for TXS1843.MULTI.1 SN 2 Rpol & Lpol IF 1 - 3

Plot file version 3 created 02-AUG-2005 13:25:15

5 TR IF 2R 1.2 1.0 0.8 5 TR IF 2L 2.0 1.5 1.0 5 TR IF 3R 1.4 1.2 1.0 5 TR IF 3L 1.3 1.2 1.1 6 HH IF 1L

2.930 2.925 2.920 2.915 6 HH IF 2R

Gain

0.405 0.400 0.395 0.390

6 HH IF 3R

0.050 0.045 0.040 0.035

6 HH IF 3L

TIME (HOURS)

07 00 10 20 30 40 50 08 00 10 20 30

0.880 0.875 0.870 0.865