Gain phs vs UTC time for TXS1843.MULTI.1 SN 1 Rpol & Lpol IF 1 - 3

Plot file version 1 created 02-AUG-2005 13:25:02

1 EF IF 1R

0.010 0.005 0.000 -0.005

1 EF IF 1L

0.010 0.005 0.000 -0.005

1 EF IF 2R

0.010 0.005 0.000 -0.005

1 EF IF 2L

0.010 0.005 0.000 -0.005

1 EF IF 3R

0.010 0.005 0.000 -0.005

1 EF IF 3L

Degrees

0.010 0.005 0.000 -0.005

2 WB IF 1R 50 0 -50 2 WB IF 1L 20 0 -20 -40 -60 2 WB IF 2R 30 20 10 0 -10 2 WB IF 2L

TIME (HOURS)

08 10 12 14 16

60 40 20 0

Gain phs vs UTC time for TXS1843.MULTI.1 SN 1 Rpol & Lpol IF 1 - 3

Plot file version 2 created 02-AUG-2005 13:25:02

2 WB IF 3R 20 0 -20 -40 2 WB IF 3L 5 0 -5 3 MC IF 1R 100 0 -100 -200 3 MC IF 1L 100 0 -100 3 MC IF 2R 100 0 -100

3 MC IF 2L

Degrees

200 0 -200 3 MC IF 3R 200 100 0 -100

4 NT IF 1L

-4.810 -4.815 -4.820 -4.825 4 NT IF 2L

-170.105 -170.110 -170.115 -170.120 4 NT IF 3L

TIME (HOURS)

08 10 12 14 16

-25.120 -25.125 -25.130 -25.135

Gain phs vs UTC time for TXS1843.MULTI.1 SN 1 Rpol & Lpol IF 1 - 3

Plot file version 3 created 02-AUG-2005 13:25:02

5 TR IF 1L 100 0 -100

5 TR IF 2R 0 -50 -100

5 TR IF 2L 100 50 0 -50 5 TR IF 3R 20 0 -20 -40 -60 5 TR IF 3L 0 -50 -100

6 HH IF 1L

Degrees

-10 -20 -30 6 HH IF 2R

60.035 60.030 60.025 60.020

6 HH IF 2L

-20.115 -20.120 -20.125 -20.130 6 HH IF 3R

-72.710 -72.715 -72.720 -72.725

6 HH IF 3L

TIME (HOURS)

08 10 12 14 16

-63.525 -63.530 -63.535 -63.540

Gain phs vs UTC time for TXS1843.MULTI.1 SN 1 Rpol & Lpol IF 1 - 3

Plot file version 4 created 02-AUG-2005 13:25:02

7 JB IF 1R

-111.960 -111.965 -111.970 -111.975 7 JB IF 2R 160 140 120 7 JB IF 2L

-146.920 -146.925 -146.930 -146.935

7 JB IF 3R

Degrees

TIME (HOURS)

08 10 12 14 16

-141.860 -141.865 -141.870 -141.875