Center at RA 18 46 03.90000 DEC -00 03 38.0000

CONT: TXS1843 IPOL 1619.572 MHZ TXS1843.ICL001.5

PLot file version 1 created 02-AUG-2005 13:27:10

Cont peak flux = 1.4856E-01 JY/BEAM Levs = 1.486E-01 * (-0.010, 0.010, 0.021, 0.041, 0.083, 0.165, 0.330, 0.660)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250