Gain amp vs UTC time for 2145+067.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 02-AUG-2005 18:49:11

1R EF

1020 1000 980 960 2R WB

1050 1000 950 3R MC

1000 900 800 4R NT

1100 1000 900 5R TR 850 800 750 7R JB

MilliGain

1000 980 960 940 8R SC

1200 1000 800 600 10R NL 900 850 800 750 11R FD 950 900 850 12R LA

TIME (HOURS)

12 14 16 18 20

1300 1200 1100 1000

Gain amp vs UTC time for 2145+067.MULTI.1 SN 2 Rpol IF 1

Plot file version 2 created 02-AUG-2005 18:49:11

13R PT 950 900 850 15R OV 980 960 940 16R BR

1140 1120 1100 1080 17R MK

MilliGain

TIME (HOURS)

12 14 16 18 20

740 720 700 680 660