Gain amp vs UTC time for TXS1843.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 02-AUG-2005 18:48:37

1R EF

1050

1000 950 2R WB

1040 1020 1000 980 960 3R MC 600 595 590 585 5R TR 765 760 755 750 7R JB

MilliGain

TIME (HOURS)

07 00 10 20 30 40 50 08 00 10 20 30

765 760 755 750