Center at RA 18 32 43.47112 DEC 13 57 44.4003

CONT: 1830+139 IPOL 1611.760 MHZ 1830+139.IIM001.2

PLot file version 1 created 02-AUG-2005 11:07:54

Cont peak flux = 3.4875E-01 JY/BEAM Levs = 3.488E-01 * (-0.144, 0.144, 0.287, 0.575)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250