Gain amp vs UTC time for TXS1843.MULTI.1 SN 2 Lpol IF 1

Plot file version 1 created 02-AUG-2005 11:08:56

1L EF

1.05 1.00 0.95

2L WB

1.02 1.00 0.98 0.96 0.94 3L MC

0.730 0.725 0.720 0.715 5L TR

0.885 0.880 0.875 0.870

6L HH

Gain

TIME (HOURS)

07 00 10 20 30 40 50 08 00 10 20 30

1.6 1.4 1.2 1.0