Center at RA 20 05 30.92980 DEC 77 52 43.1370

CONT: 2007+777 IPOL 4986.302 MHZ 2007+777.ICL001.5

PLot file version 1 created 22-JUN-2004 17:45:54

Cont peak flux = 5.5351E-01 JY/BEAM Levs = 5.535E-01 * (-0.028, 0.028, 0.056, 0.112, 0.225, 0.450, 0.900)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100