Gain amp vs UTC time for 2007+777.MULTI.1 SN 2 Lpol IF 1 - 4

Plot file version 1 created 23-JUN-2004 09:35:25

1L EB IF 1

0.94 0.92 0.90 0.88 0.86 1L EB IF 2

0.94 0.92 0.90 0.88 1L EB IF 3

0.94 0.92 0.90 0.88

1L EB IF 4

0.94 0.92 0.90 0.88 0.86

2L MC IF 1

0.95 0.90 0.85 0.80

2L MC IF 2

Gain

0.95 0.90 0.85

2L MC IF 3

0.90

0.85

0.80 2L MC IF 4

0.95 0.90 0.85 0.80 0.75 3L NT IF 1

1.00 0.98 0.96 0.94

3L NT IF 2

TIME (HOURS)

1/00 12 13 14 15 16 17 18 19 20

1.24 1.22 1.20 1.18 1.16

Gain amp vs UTC time for 2007+777.MULTI.1 SN 2 Lpol IF 1 - 4

Plot file version 2 created 23-JUN-2004 09:35:25

3L NT IF 3

0.98 0.96 0.94 0.92

3L NT IF 4

0.995 0.990 0.985 0.980 4L ON IF 1

0.92 0.90 0.88

4L ON IF 2

0.90 0.88 0.86 0.84 4L ON IF 3

0.93 0.92 0.91 0.90 0.89 4L ON IF 4

Gain

0.91 0.90 0.89

6L WB IF 1 0.9 0.8 0.7 6L WB IF 2

0.675 0.670 0.665 0.660 0.655 6L WB IF 3

0.64

0.62

0.60 6L WB IF 4

TIME (HOURS)

1/00 12 13 14 15 16 17 18 19 20

0.645 0.640 0.635 0.630 0.625

Gain amp vs UTC time for 2007+777.MULTI.1 SN 2 Lpol IF 1 - 4

Plot file version 3 created 23-JUN-2004 09:35:25

7L TR IF 1

1.10 1.05

7L TR IF 2

1.20 1.15 1.10 7L TR IF 3

1.15 1.10 1.05 7L TR IF 4

1.20 1.15 1.10

8L NL IF 1

0.94 0.92 0.90 0.88 0.86 0.84 8L NL IF 2

Gain

1.1 1.0 0.9 8L NL IF 3 1.2 1.1 1.0 0.9 8L NL IF 4

1.10 1.05 1.00

9L HN IF 1

0.96 0.95 0.94 0.93 9L HN IF 2

TIME (HOURS)

1/00 12 13 14 15 16 17 18 19 20

0.95 0.90

Gain amp vs UTC time for 2007+777.MULTI.1 SN 2 Lpol IF 1 - 4

Plot file version 4 created 23-JUN-2004 09:35:25

9L HN IF 3

0.95 0.90 0.85

9L HN IF 4

1.05

1.00

0.95

10L SC IF 1 1.6 1.4 1.2 10L SC IF 2 1.2 1.1 1.0 10L SC IF 3

1.20 1.15 1.10 1.05

10L SC IF 4

Gain

1.2 1.1 1.0 11L BR IF 1 1.0 0.9 0.8 11L BR IF 2 1.0 0.9 0.8 11L BR IF 3

1.05 1.00 0.95 0.90

11L BR IF 4

TIME (HOURS)

1/00 12 13 14 15 16 17 18 19 20

1.15 1.10 1.05 1.00 0.95

Gain amp vs UTC time for 2007+777.MULTI.1 SN 2 Lpol IF 1 - 4

Plot file version 5 created 23-JUN-2004 09:35:25

13L LA IF 1

0.96 0.94 0.92 0.90 0.88 0.86

13L LA IF 2

0.98 0.96 0.94 0.92

13L LA IF 3

0.94 0.92 0.90

13L LA IF 4

0.90 0.88 0.86 0.84

14L OV IF 1 1.1 1.0 0.9 14L OV IF 2

Gain

1.1 1.0 0.9 14L OV IF 3 1.1 1.0 0.9 14L OV IF 4

1.05 1.00 0.95

15L PT IF 1

1.05 1.00 0.95 0.90

15L PT IF 2

TIME (HOURS)

1/00 12 13 14 15 16 17 18 19 20

1.05 1.00 0.95

Gain amp vs UTC time for 2007+777.MULTI.1 SN 2 Lpol IF 1 - 4

Plot file version 6 created 23-JUN-2004 09:35:25

15L PT IF 3

1.05 1.00 0.95

15L PT IF 4

1.00 0.98 0.96 0.94 0.92

16L KP IF 1

0.98 0.96 0.94 0.92

16L KP IF 2

1.05 1.00 0.95

16L KP IF 3

1.00

0.95

0.90

16L KP IF 4

Gain

1.00 0.95 0.90

17L MK IF 1 1.3 1.2 1.1 17L MK IF 2

1.15 1.10 1.05

17L MK IF 3

1.15 1.10 1.05 1.00

17L MK IF 4

TIME (HOURS)

1/00 12 13 14 15 16 17 18 19 20

1.2 1.1 1.0

Gain amp vs UTC time for 2007+777.MULTI.1 SN 2 Lpol IF 1 - 4

Plot file version 7 created 23-JUN-2004 09:35:25

18L YY IF 1 1.1 1.0 0.9 18L YY IF 2 1.3 1.2 1.1 18L YY IF 3

1.25 1.20 1.15 1.10 1.05

18L YY IF 4

Gain

TIME (HOURS)

1/00 12 13 14 15 16 17 18 19 20

1.3 1.2 1.1