Center at RA 20 05 30.92980 DEC 77 52 43.1370

CONT: 2007+777 IPOL 4986.302 MHZ 2007+777.IIM001.1

PLot file version 1 created 23-JUN-2004 09:32:21

Cont peak flux = 6.2603E-01 JY/BEAM Levs = 6.260E-01 * (-0.398, 0.398, 0.797)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100