Center at RA 08 53 48.18800 DEC 06 54 47.2330

CONT: P0850 IPOL 4986.302 MHZ P0850.ICL001.5

PLot file version 1 created 23-JUN-2004 09:35:48

Cont peak flux = 2.5619E-01 JY/BEAM Levs = 2.562E-01 * (-0.008, 0.008, 0.016, 0.031, 0.062, 0.124, 0.248, 0.497, 0.994)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100