Center at RA 11 57 34.83600 DEC 16 38 59.6700

CONT: P1152 IPOL 4986.302 MHZ P1152.IIM001.1

PLot file version 1 created 23-JUN-2004 11:13:50

Cont peak flux = 5.3866E-01 JY/BEAM Levs = 5.387E-01 * (-0.290, 0.290, 0.580)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100