Center at RA 20 05 30.99852 DEC 77 52 43.2476

CONT: 2007+777 IPOL 8413.365 MHZ 2007+777.ICL001.3

PLot file version 1 created 17-DEC-2002 11:37:15

Cont peak flux = 5.1520E-01 JY/BEAM Levs = 5.152E-01 * (-0.007, 0.007, 0.014, 0.028, 0.057, 0.114, 0.227, 0.455, 0.909)

MilliARC SEC

MilliARC SEC

40 20 0 -20 -40

50

40

30

20

10

0

-10

-20

-30

-40

-50