Gain amp vs UTC time for 3C84.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 17-DEC-2002 11:34:52

1R EB 1.1 1.0 0.9 2R WB 1.1 1.0 0.9 3R ON 8 6 4 2 4R MC 1.2 1.0 0.8 5R YB 100 50 0 6R SC

Gain

1.04 1.02 1.00 0.98 0.96 0.94 7R HN 1.2 1.1 1.0 8R NL 1.2 1.1 1.0 9R FD

1.05 1.00 0.95 0.90 10R LA

TIME (HOURS)

18 19 20 21 22 23 1/00 1/01

0.95

0.90

0.85

Gain amp vs UTC time for 3C84.MULTI.1 SN 2 Rpol IF 1

Plot file version 2 created 17-DEC-2002 11:34:52

11R PT 1.1 1.0 0.9 12R KP

0.95 0.90 0.85 0.80 13R OV 20 10 0 14R BR

1.10 1.05 1.00

15R MK

Gain

TIME (HOURS)

18 19 20 21 22 23 1/00 1/01

8 6 4 2

Gain amp vs UTC time for 3C84.MULTI.1 SN 2 Rpol IF 2

Plot file version 3 created 17-DEC-2002 11:34:52

1R EB

1.05 1.00 0.95 0.90

2R WB 1.0 0.9 0.8 3R ON 3 2 1 4R MC 1.2 1.0 0.8 5R YB 1.2 1.1 1.0 0.9 6R SC

Gain

1.0 0.9 0.8 7R HN 1.1 1.0 0.9 8R NL 1.2 1.1 1.0 9R FD

1.10 1.05 1.00 0.95 10R LA

TIME (HOURS)

18 19 20 21 22 23 1/00 1/01

0.98 0.96 0.94 0.92 0.90 0.88

Gain amp vs UTC time for 3C84.MULTI.1 SN 2 Rpol IF 2

Plot file version 4 created 17-DEC-2002 11:34:52

11R PT 1.2 1.1 1.0 0.9 12R KP

0.95 0.90 0.85 0.80 13R OV

1.05 1.00 0.95

14R BR 1.2 1.1 1.0 15R MK

Gain

TIME (HOURS)

18 19 20 21 22 23 1/00 1/01

8 6 4 2

Gain amp vs UTC time for 3C84.MULTI.1 SN 2 Lpol IF 1

Plot file version 5 created 17-DEC-2002 11:34:53

1L EB

1.10 1.05 1.00 0.95

2L WB 1.1 1.0 0.9 0.8 4L MC 1.2 1.0 0.8 6L SC

1.16 1.14 1.12 1.10 1.08 1.06

7L HN 1.3 1.2 1.1 1.0 8L NL

Gain

1.3 1.2 1.1 9L FD

1.15 1.10 1.05 1.00

10L LA

1.05 1.00 0.95

11L PT 1.2 1.1 1.0 12L KP

TIME (HOURS)

18 19 20 21 22 23 1/00 1/01

1.1 1.0 0.9

Gain amp vs UTC time for 3C84.MULTI.1

SN 2 Lpol IF 1

Plot file version 6 created 17-DEC-2002 11:34:53

13L OV 5 4 3 2 1 14L BR

1.20 1.15 1.10 1.05

15L MK

Gain

TIME (HOURS)

18 19 20 21 22 23 1/00 1/01

10 8 6 4 2

Gain amp vs UTC time for 3C84.MULTI.1 SN 2 Lpol IF 2

Plot file version 7 created 17-DEC-2002 11:34:53

1L EB

1.15 1.10 1.05 1.00 0.95

2L WB 1.0 0.9 0.8 0.7 4L MC 1.1 1.0 0.9 0.8 6L SC

1.20 1.15 1.10

7L HN 1.3 1.2 1.1 1.0 8L NL

Gain

1.3 1.2 1.1 1.0 9L FD 1.2 1.1 1.0 10L LA

1.05 1.00 0.95

11L PT 1.2 1.1 1.0 12L KP

TIME (HOURS)

18 19 20 21 22 23 1/00 1/01

1.05 1.00 0.95 0.90

Gain amp vs UTC time for 3C84.MULTI.1 SN 2 Lpol IF 2

Plot file version 8 created 17-DEC-2002 11:34:53

13L OV

1.20 1.15 1.10

14L BR

1.15 1.10 1.05

15L MK

Gain

TIME (HOURS)

18 19 20 21 22 23 1/00 1/01

10 8 6 4 2

Gain amp vs UTC time for 1156+295.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 17-DEC-2002 11:35:47

6R SC

1050 1000 950 7R HN 1010 1000 990 8R NL

1100 1050 1000 950 9R FD 940 920 900 880 10R LA 960 940 920 11R PT

MilliGain

1000 980 960 940 12R KP 920 910 900 890 13R OV

1200 1100 1000 900 14R BR 960 940 920 15R MK

TIME (HOURS)

1/08 1/09 1/10 1/11 1/12 1/13 1/14

990 980 970 960

Gain amp vs UTC time for 1156+295.MULTI.1 SN 2 Rpol IF 2

Plot file version 2 created 17-DEC-2002 11:35:48

6R SC

1000 950 900 7R HN 980 960 940 8R NL

1100 1050 1000 950 9R FD

1000 980 960 940 920 10R LA

1000 980 960 940 11R PT

MilliGain

1020 1000 980 960 12R KP 930 920 910 900 13R OV

1200 1100 1000

14R BR 940 920 900 15R MK

TIME (HOURS)

1/08 1/09 1/10 1/11 1/12 1/13 1/14

970 965 960 955

Gain amp vs UTC time for 1156+295.MULTI.1 SN 2 Lpol IF 1

Plot file version 3 created 17-DEC-2002 11:35:48

6L SC

1200 1150 1100

7L HN

1020 1010 1000 990 8L NL

1200 1150 1100 1050

9L FD

1040 1020 1000 980 10L LA

1060 1040 1020

11L PT

MilliGain

1040 1020 1000

12L KP

1020 1010 1000 990 13L OV

1300 1200 1100

14L BR

1040 1020 1000 980 15L MK

TIME (HOURS)

1/08 1/09 1/10 1/11 1/12 1/13 1/14

1040 1030 1020

Gain amp vs UTC time for 1156+295.MULTI.1 SN 2 Lpol IF 2

Plot file version 4 created 17-DEC-2002 11:35:48

6L SC

1100 1050 1000

7L HN

1040 1030 1020 1010

8L NL

1150 1100 1050 1000

9L FD

1060 1040 1020 1000 980 960 10L LA

1080 1060 1040

11L PT

MilliGain

1150 1100 1050

12L KP

1000 990 980 970 13L OV

1300 1200 1100

14L BR

1140 1120 1100 1080

15L MK

TIME (HOURS)

1/08 1/09 1/10 1/11 1/12 1/13 1/14

1060 1050 1040

Gain amp vs UTC time for 1308+326.MULTI.1 SN 2 Lpol IF 1

Plot file version 3 created 17-DEC-2002 11:36:26

6L SC

1140 1130 1120

7L HN

1020 1010 1000 990 8L NL

1070 1065 1060

9L FD

1040 1030 1020

10L LA

1040 1035 1030

11L PT

MilliGain

1004 1002 1000 998 996 994 12L KP

1035 1030 1025

13L OV

1080 1070 1060

14L BR

1010 1005 1000

15L MK

TIME (HOURS)

1/08 46 47 48 49 50 51 52 53 54

1100 1050 1000

Gain amp vs UTC time for 1308+326.MULTI.1 SN 2 Lpol IF 2

Plot file version 4 created 17-DEC-2002 11:36:26

6L SC

1030 1020 1010 1000

7L HN

1040 1030 1020

8L NL 1005 1000 995 9L FD

1040 1035 1030

10L LA 1050 1045

11L PT

MilliGain

1135 1130 1125 1120

12L KP

1015 1010 1005 1000

13L OV

1070 1065 1060

14L BR 1130 1120 1110

15L MK

TIME (HOURS)

1/08 46 47 48 49 50 51 52 53 54

1150 1100 1050

Gain amp vs UTC time for 2007+777.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 17-DEC-2002 11:37:04

1R EB 2.0 1.5 1.0 2R WB

0.83 0.82 0.81

3R ON 2.0 1.5 1.0 4R MC

0.82 0.81 0.80

5R YB

0.84 0.82 0.80 0.78

6R SC

Gain

0.80 0.78 0.76 7R HN

0.88 0.86 0.84 8R NL

0.805 0.800 0.795

9R FD

0.77 0.76 0.75 11R PT

TIME (HOURS)

14 36 37 38 39 40 41 42 43 44 45

0.805 0.800 0.795 0.790

Gain amp vs UTC time for 2007+777.MULTI.1 SN 2 Rpol IF 1

Plot file version 2 created 17-DEC-2002 11:37:04

12R KP

0.79 0.78 0.77 0.76 0.75 13R OV

0.765 0.760 0.755

14R BR

0.80

0.78

0.76 15R MK

Gain

TIME (HOURS)

14 36 37 38 39 40 41 42 43 44 45

0.82 0.81 0.80

Gain amp vs UTC time for 2007+777.MULTI.1 SN 2 Rpol IF 2

Plot file version 3 created 17-DEC-2002 11:37:04

1R EB 2.0 1.5 1.0 2R WB

0.79 0.78 0.77

3R ON 2.0 1.5 1.0 4R MC

0.835 0.830 0.825

5R YB

0.86 0.84 0.82 0.80 0.78

6R SC

Gain

0.76 0.75 0.74 0.73

7R HN

0.84 0.82 0.80 0.78

8R NL

0.808 0.806 0.804 0.802 0.800 0.798

9R FD

0.815 0.810 0.805 0.800 0.795

11R PT

TIME (HOURS)

14 36 37 38 39 40 41 42 43 44 45

0.815 0.810 0.805 0.800

Gain amp vs UTC time for 2007+777.MULTI.1 SN 2 Rpol IF 2

Plot file version 4 created 17-DEC-2002 11:37:04

12R KP 0.78 0.77 0.76

13R OV

0.812 0.810 0.808 0.806 0.804 0.802

14R BR

0.770 0.765 0.760 0.755

15R MK

Gain

TIME (HOURS)

14 36 37 38 39 40 41 42 43 44 45

0.81 0.80 0.79 0.78

Gain amp vs UTC time for 2007+777.MULTI.1 SN 2 Lpol IF 1

Plot file version 5 created 17-DEC-2002 11:37:04

1L EB 840 835 830 825 2L WB 775 770 765 760 755 4L MC 810 800 790 6L SC 890 880 870 860 7L HN 880 860 840 8L NL

MilliGain

915 910 905 900 9L FD 845 840 835 11L PT 870 860 850 12L KP 880 860 840 13L OV

TIME (HOURS)

14 36 37 38 39 40 41 42 43 44 45

940 930 920

Gain amp vs UTC time for 2007+777.MULTI.1 SN 2 Lpol IF 1

Plot file version 6 created 17-DEC-2002 11:37:04

14L BR 880 860 840 15L MK

MilliGain

TIME (HOURS)

14 36 37 38 39 40 41 42 43 44 45

880 870 860

Gain amp vs UTC time for 2007+777.MULTI.1 SN 2 Lpol IF 2

Plot file version 7 created 17-DEC-2002 11:37:04

1L EB 875 870 865 860 855 2L WB 780 770 760 750 4L MC 820 810 800 790 6L SC 900 890 880 7L HN 900 880 860 840 8L NL

MilliGain

840 835 830 9L FD 870 860 850 840 11L PT 870 865 860 12L KP 860 840 820 13L OV

TIME (HOURS)

14 36 37 38 39 40 41 42 43 44 45

920 910 900

Gain amp vs UTC time for 2007+777.MULTI.1 SN 2 Lpol IF 2

Plot file version 8 created 17-DEC-2002 11:37:04

14L BR 850 840 830 820 810 15L MK

MilliGain

TIME (HOURS)

14 36 37 38 39 40 41 42 43 44 45

900 880 860