IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 1 created 15-NOV-2004 14:33:29

-2.0 -2.5 -3.0 -3.5 -4.0

EF-JB-MC

0 -1 -2

EF-JB-ON

Degrees

1.0 0.5 0.0 -0.5

EF-JB-TR

4.0 3.5 3.0 2.5 2.0

EF-JB-WB

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

0 -1 -2 -3

EF-JB-NT

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 2 created 15-NOV-2004 14:33:29 2.0 1.5 1.0 0.5 0.0 -0.5

EF-JB-PT

0 -5 -10

EF-JB-SC

Degrees

-50 -100

-150

EF-JB-HN

4 2 0 -2

EF-JB-NL

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

-0.5 -1.0 -1.5 -2.0 -2.5 -3.0

EF-JB-FD

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 3 created 15-NOV-2004 14:33:29

0.0 -0.5 -1.0 -1.5 -2.0

EF-JB-LA

2 1 0

EF-JB-KP

Degrees

1 0 -1 -2

EF-JB-OV

0.0 -0.5 -1.0 -1.5 -2.0 -2.5

EF-JB-BR

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

8.5 8.0 7.5 7.0 6.5 6.0

EF-MC-ON

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 4 created 15-NOV-2004 14:33:29 2.0 1.5 1.0 0.5 0.0 -0.5

EF-MC-TR

3.0 2.5 2.0 1.5 1.0

EF-MC-WB

Degrees

2 1 0 -1

EF-MC-NT

7 6 5 4

EF-MC-PT

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

70 60 50 40

EF-MC-SC

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 5 created 15-NOV-2004 14:33:29

200 150 100 50 0 -50

EF-MC-HN

4.0 3.5 3.0 2.5 2.0 1.5

EF-MC-NL

Degrees

6 5 4 3

EF-MC-FD

5.5 5.0 4.5 4.0 3.5

EF-MC-LA

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

9 8 7 6

EF-MC-KP

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 6 created 15-NOV-2004 14:33:29 5.5 5.0 4.5 4.0 3.5

EF-MC-OV

9 8 7

EF-MC-BR

Degrees

3.5 3.0 2.5 2.0 1.5

EF-ON-TR

4.5 4.0 3.5 3.0

EF-ON-WB

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

-1.5 -2.0 -2.5 -3.0 -3.5 -4.0

EF-ON-NT

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 7 created 15-NOV-2004 14:33:29

-6.0 -6.5 -7.0 -7.5 -8.0 -8.5

EF-ON-PT

-6 -8 -10 -12

EF-ON-SC

Degrees

100 50 0 -50

EF-ON-HN

-4 -5 -6 -7 -8 -9

EF-ON-NL

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

-8.0 -8.5 -9.0 -9.5 -10.0

EF-ON-FD

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 8 created 15-NOV-2004 14:33:29

-8.0 -8.5 -9.0 -9.5 -10.0 -10.5

EF-ON-LA

-6.0 -6.5 -7.0 -7.5 -8.0 -8.5

EF-ON-KP

Degrees

-5 -6 -7 -8

EF-ON-OV

-3 -4 -5 -6

EF-ON-BR

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

2.5 2.0 1.5 1.0

EF-TR-WB

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 9 created 15-NOV-2004 14:33:30

-2.0 -2.5 -3.0 -3.5 -4.0

EF-TR-NT

1.0 0.5 0.0 -0.5 -1.0 -1.5

EF-TR-PT

Degrees

10 5 0

EF-TR-SC

200 150 100 50 0

EF-TR-HN

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

3 2 1 0 -1 -2

EF-TR-NL

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 10 created 15-NOV-2004 14:33:30

-1.5 -2.0 -2.5 -3.0 -3.5 -4.0

EF-TR-FD

-1.0 -1.5 -2.0 -2.5 -3.0

EF-TR-LA

Degrees

-1 -2 -3 -4

EF-TR-KP

1 0 -1 -2

EF-TR-OV

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

2 1 0

EF-TR-BR

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 11 created 15-NOV-2004 14:33:30

-3.0 -3.5 -4.0 -4.5 -5.0 -5.5

EF-WB-NT

0.0 -0.5 -1.0 -1.5 -2.0

EF-WB-PT

Degrees

-10 -12 -14 -16 -18

EF-WB-SC

0 -50 -100

EF-WB-HN

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

1 0 -1 -2

EF-WB-NL

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 12 created 15-NOV-2004 14:33:30

-1.5 -2.0 -2.5 -3.0 -3.5 -4.0

EF-WB-FD

-2.0 -2.5 -3.0 -3.5 -4.0

EF-WB-LA

Degrees

-1.0 -1.5 -2.0 -2.5 -3.0

EF-WB-KP

-1.0 -1.5 -2.0 -2.5 -3.0 -3.5

EF-WB-OV

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

-0.5 -1.0 -1.5 -2.0 -2.5

EF-WB-BR

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 15 created 15-NOV-2004 14:33:30

-34 -36 -38 -40

EF-PT-HN

0.0 -0.5 -1.0 -1.5 -2.0 -2.5

EF-PT-NL

Degrees

0.5 0.0 -0.5 -1.0 -1.5

EF-PT-FD

5.0 4.5 4.0 3.5 3.0

EF-PT-LA

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

-5.0 -5.5 -6.0 -6.5

EF-PT-KP

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 16 created 15-NOV-2004 14:33:30

-5.5 -6.0 -6.5 -7.0 -7.5

EF-PT-OV

4.0 3.5 3.0 2.5 2.0 1.5

EF-PT-BR

Degrees

-50 -100

-150

EF-SC-HN

10

5

0

EF-SC-NL

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

8 6 4 2

EF-SC-FD

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 17 created 15-NOV-2004 14:33:30

15 10 5 0 -5

EF-SC-LA

10 5 0 -5 -10

EF-SC-KP

Degrees

0 -1 -2 -3

EF-SC-OV

20 15 10 5

EF-SC-BR

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

150 100 50

EF-HN-NL

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 18 created 15-NOV-2004 14:33:30

150 100 50

EF-HN-FD

150 100 50

EF-HN-LA

Degrees

50 0 -50 -100 -150

EF-HN-KP

50 40 30 20

EF-HN-OV

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

150 100 50

EF-HN-BR

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 19 created 15-NOV-2004 14:33:30

-1 -2 -3 -4

EF-NL-FD

0 -2 -4

EF-NL-LA

Degrees

5 4 3 2 1 0

EF-NL-KP

2 1 0 -1

EF-NL-OV

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

0 -2 -4 -6

EF-NL-BR

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 20 created 15-NOV-2004 14:33:30

0.5 0.0 -0.5 -1.0 -1.5 -2.0

EF-FD-LA

1.5 1.0 0.5 0.0 -0.5 -1.0

EF-FD-KP

Degrees

0.0 -0.5 -1.0 -1.5 -2.0 -2.5

EF-FD-OV

0 -1 -2 -3

EF-FD-BR

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

-2.5 -3.0 -3.5 -4.0 -4.5 -5.0

EF-LA-KP

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 21 created 15-NOV-2004 14:33:30

-5.5 -6.0 -6.5 -7.0 -7.5

EF-LA-OV

4.5 4.0 3.5 3.0 2.5

EF-LA-BR

Degrees

-8.5 -9.0 -9.5 -10.0 -10.5

EF-KP-OV

7.5 7.0 6.5 6.0 5.5 5.0

EF-KP-BR

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

6.0 5.5 5.0 4.5 4.0 3.5

EF-OV-BR

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 22 created 15-NOV-2004 14:33:30

6.5 6.0 5.5 5.0 4.5

JB-MC-ON

-1.5 -2.0 -2.5 -3.0 -3.5

JB-MC-TR

Degrees

-3.0 -3.5 -4.0 -4.5 -5.0

JB-MC-WB

0.0 -0.5 -1.0 -1.5

JB-MC-NT

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

3 2 1 0

JB-MC-PT

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 23 created 15-NOV-2004 14:33:31 80 70 60 50 40

JB-MC-SC

-20 -22 -24 -26 -28

JB-MC-HN

Degrees

2 0 -2 -4 -6

JB-MC-NL

6 5 4 3 2

JB-MC-FD

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

3.5 3.0 2.5 2.0 1.5 1.0

JB-MC-LA

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 24 created 15-NOV-2004 14:33:31

4.0 3.5 3.0 2.5 2.0 1.5

JB-MC-KP

3 2 1 0

JB-MC-OV

Degrees

8 7 6 5 4

JB-MC-BR

2.5 2.0 1.5 1.0 0.5 0.0

JB-ON-TR

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

1.0 0.5 0.0 -0.5 -1.0 -1.5

JB-ON-WB

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 25 created 15-NOV-2004 14:33:31

0 -1 -2 -3 -4

JB-ON-NT

-8.0 -8.5 -9.0 -9.5

JB-ON-PT

Degrees

-2 -4 -6 -8

JB-ON-SC

-20 -40 -60 -80

JB-ON-HN

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

-7 -8 -9 -10 -11 -12

JB-ON-NL

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 26 created 15-NOV-2004 14:33:31

-7.0 -7.5 -8.0 -8.5 -9.0 -9.5

JB-ON-FD

-7 -8 -9 -10

JB-ON-LA

Degrees

-8 -9 -10

JB-ON-KP

-6 -7 -8

JB-ON-OV

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

-3 -4 -5 -6

JB-ON-BR

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 27 created 15-NOV-2004 14:33:31

0.0 -0.5 -1.0 -1.5 -2.0

JB-TR-WB

1 0 -1 -2

JB-TR-NT

Degrees

0.0 -0.5 -1.0 -1.5 -2.0

JB-TR-PT

20 10 0

JB-TR-SC

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

20 10 0 -10

JB-TR-HN

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 30 created 15-NOV-2004 14:33:31

4 2 0

JB-WB-NL

4 3 2 1

JB-WB-FD

Degrees

2.0 1.5 1.0 0.5 0.0

JB-WB-LA

1.5 1.0 0.5 0.0 -0.5 -1.0

JB-WB-KP

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

2 1 0 -1

JB-WB-OV

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 31 created 15-NOV-2004 14:33:31

4.0 3.5 3.0 2.5 2.0 1.5

JB-WB-BR

1.0 0.5 0.0 -0.5 -1.0 -1.5

JB-NT-PT

Degrees

-40 -45 -50 -55

JB-NT-SC

-4 -6 -8 -10 -12

JB-NT-HN

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

5

0

-5

JB-NT-NL

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 32 created 15-NOV-2004 14:33:31

1 0 -1 -2

JB-NT-FD

5 4 3 2 1

JB-NT-LA

Degrees

8 6 4

JB-NT-KP

6.0 5.5 5.0 4.5 4.0

JB-NT-OV

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

8 7 6 5 4 3

JB-NT-BR

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 33 created 15-NOV-2004 14:33:31

12 11 10 9 8 7

JB-PT-SC

-8 -10 -12 -14

JB-PT-HN

Degrees

-3.0 -3.5 -4.0 -4.5 -5.0 -5.5

JB-PT-NL

3 2 1 0

JB-PT-FD

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

7.5 7.0 6.5 6.0 5.5 5.0

JB-PT-LA

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 34 created 15-NOV-2004 14:33:31 -5.0 -5.5 -6.0 -6.5 -7.0

JB-PT-KP

-3 -4 -5 -6 -7

JB-PT-OV

Degrees

5.5 5.0 4.5 4.0 3.5 3.0

JB-PT-BR

-2 -4 -6 -8 -10

JB-SC-HN

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

0 -2 -4

JB-SC-NL

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 35 created 15-NOV-2004 14:33:31 10 5 0 -5

JB-SC-FD

4 2 0 -2 -4

JB-SC-LA

Degrees

0 -2 -4 -6 -8 -10

JB-SC-KP

2 0 -2 -4 -6 -8

JB-SC-OV

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

14 12 10 8

JB-SC-BR

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 36 created 15-NOV-2004 14:33:31 -2 -4 -6 -8 -10 -12 -14

JB-HN-NL

5

0

-5

JB-HN-FD

Degrees

18 16 14 12 10

JB-HN-LA

20 18 16 14 12

JB-HN-KP

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

2 0 -2 -4 -6

JB-HN-OV

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 37 created 15-NOV-2004 14:33:31 20 15 10 5

JB-HN-BR

4 2 0 -2 -4

JB-NL-FD

Degrees

5

0

-5

JB-NL-LA

8 6 4 2 0 -2

JB-NL-KP

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

6 5 4 3 2

JB-NL-OV

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 38 created 15-NOV-2004 14:33:32

4 2 0 -2 -4 -6

JB-NL-BR

0 -1 -2 -3

JB-FD-LA

Degrees

0 -1 -2 -3 -4

JB-FD-KP

-1 -2 -3 -4 -5

JB-FD-OV

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

-1 -2 -3 -4

JB-FD-BR

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 39 created 15-NOV-2004 14:33:32

-4 -5 -6 -7

JB-LA-KP

-6.0 -6.5 -7.0 -7.5 -8.0

JB-LA-OV

Degrees

5 4 3 2

JB-LA-BR

-6 -7 -8 -9 -10

JB-KP-OV

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

9 8 7

JB-KP-BR

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 40 created 15-NOV-2004 14:33:32

6 5 4

JB-OV-BR

10.5 10.0 9.5 9.0 8.5 8.0

MC-ON-TR

Degrees

10.0 9.5 9.0 8.5 8.0

MC-ON-WB

6 5 4 3 2

MC-ON-NT

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

-3 -4 -5 -6

MC-ON-PT

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 41 created 15-NOV-2004 14:33:32

-40 -50 -60 -70

MC-ON-SC

20 0 -20 -40

MC-ON-HN

Degrees

1 0 -1 -2 -3 -4

MC-ON-NL

-4 -5 -6 -7 -8

MC-ON-FD

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

-4 -5 -6 -7

MC-ON-LA

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 42 created 15-NOV-2004 14:33:32

-6 -7 -8 -9

MC-ON-KP

-2 -3 -4 -5

MC-ON-OV

Degrees

-2 -3 -4 -5 -6 -7

MC-ON-BR

1.5 1.0 0.5 0.0 -0.5

MC-TR-WB

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

-1.5 -2.0 -2.5 -3.0 -3.5 -4.0

MC-TR-NT

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 45 created 15-NOV-2004 14:33:32

-3.5 -4.0 -4.5 -5.0 -5.5

MC-WB-PT

-55 -60 -65 -70 -75 -80

MC-WB-SC

Degrees

70 60 50

MC-WB-HN

1 0 -1 -2

MC-WB-NL

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

-4.5 -5.0 -5.5 -6.0 -6.5 -7.0

MC-WB-FD

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 46 created 15-NOV-2004 14:33:32

-4.0 -4.5 -5.0 -5.5 -6.0 -6.5

MC-WB-LA

-6 -7 -8

MC-WB-KP

Degrees

-3.5 -4.0 -4.5 -5.0 -5.5 -6.0

MC-WB-OV

-6 -7 -8 -9

MC-WB-BR

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

-1 -2 -3 -4

MC-NT-PT

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 47 created 15-NOV-2004 14:33:32

-80 -100 -120

MC-NT-SC

18 16 14 12

MC-NT-HN

Degrees

3 2 1 0 -1 -2

MC-NT-NL

-3 -4 -5 -6

MC-NT-FD

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

2 1 0 -1 -2

MC-NT-LA

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 48 created 15-NOV-2004 14:33:32

4 2 0

MC-NT-KP

4.0 3.5 3.0 2.5 2.0 1.5

MC-NT-OV

Degrees

0 -1 -2 -3

MC-NT-BR

-25 -30 -35 -40 -45

MC-PT-SC

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

17 16 15 14

MC-PT-HN

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 49 created 15-NOV-2004 14:33:32

4 3 2 1 0

MC-PT-NL

1.5 1.0 0.5 0.0

MC-PT-FD

Degrees

6.5 6.0 5.5 5.0 4.5 4.0

MC-PT-LA

-5 -6 -7 -8 -9 -10

MC-PT-KP

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

-4.5 -5.0 -5.5 -6.0 -6.5

MC-PT-OV

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 50 created 15-NOV-2004 14:33:32

1.5 1.0 0.5 0.0 -0.5 -1.0

MC-PT-BR

100 90 80 70 60

MC-SC-HN

Degrees

80 70 60 50 40

MC-SC-NL

70 60 50 40

MC-SC-FD

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

80 70 60 50 40 30

MC-SC-LA

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 51 created 15-NOV-2004 14:33:32

70 60 50 40 30

MC-SC-KP

70 60 50 40

MC-SC-OV

Degrees

80 70 60 50 40

MC-SC-BR

-26 -28 -30

MC-HN-NL

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

-26 -28 -30 -32

MC-HN-FD

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 52 created 15-NOV-2004 14:33:33 -10 -12 -14 -16

MC-HN-LA

-6 -8 -10 -12 -14

MC-HN-KP

Degrees

-25 -26 -27 -28 -29 -30

MC-HN-OV

-15

-20

-25

MC-HN-BR

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

-2 -3 -4 -5 -6 -7

MC-NL-FD

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 53 created 15-NOV-2004 14:33:33 0 -2 -4 -6

MC-NL-LA

0 -1 -2 -3 -4

MC-NL-KP

Degrees

0 -1 -2

MC-NL-OV

-6 -8 -10 -12

MC-NL-BR

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

1 0 -1 -2

MC-FD-LA

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 54 created 15-NOV-2004 14:33:33

0 -1 -2 -3 -4 -5

MC-FD-KP

0 -1 -2 -3

MC-FD-OV

Degrees

-4 -5 -6

MC-FD-BR

-5 -6 -7 -8

MC-LA-KP

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

-5.5 -6.0 -6.5 -7.0 -7.5

MC-LA-OV

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 55 created 15-NOV-2004 14:33:33

1 0 -1 -2

MC-LA-BR

-5 -6 -7 -8 -9

MC-KP-OV

Degrees

8 7 6 5 4 3

MC-KP-BR

3 2 1 0

MC-OV-BR

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

1.5 1.0 0.5 0.0

ON-TR-WB

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 56 created 15-NOV-2004 14:33:33

3.5 3.0 2.5 2.0 1.5 1.0

ON-TR-NT

10.0 9.5 9.0 8.5

ON-TR-PT

Degrees

30 25 20 15 10 5

ON-TR-SC

70 60 50 40 30 20

ON-TR-HN

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

14 12 10 8 6

ON-TR-NL

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 57 created 15-NOV-2004 14:33:33 10 9 8 7

ON-TR-FD

11 10 9

ON-TR-LA

Degrees

10 9 8 7 6

ON-TR-KP

11 10 9 8 7

ON-TR-OV

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

11 10 9 8 7 6

ON-TR-BR

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 60 created 15-NOV-2004 14:33:33

8.5 8.0 7.5 7.0

ON-NT-PT

-30 -35 -40 -45 -50 -55

ON-NT-SC

Degrees

60 40 20 0

ON-NT-HN

10 8 6 4

ON-NT-NL

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

7 6 5 4

ON-NT-FD

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 61 created 15-NOV-2004 14:33:33

14 12 10 8

ON-NT-LA

18 16 14 12 10 8

ON-NT-KP

Degrees

13 12 11 10 9

ON-NT-OV

10 9 8 7 6

ON-NT-BR

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

12 10 8 6 4 2

ON-PT-SC

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 62 created 15-NOV-2004 14:33:33

0 -5 -10

ON-PT-HN

-2.0 -2.5 -3.0 -3.5 -4.0

ON-PT-NL

Degrees

2.0 1.5 1.0 0.5 0.0

ON-PT-FD

8 7 6 5 4

ON-PT-LA

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

-4.0 -4.5 -5.0 -5.5 -6.0 -6.5

ON-PT-KP

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 63 created 15-NOV-2004 14:33:33

-5.5 -6.0 -6.5 -7.0 -7.5

ON-PT-OV

0.5 0.0 -0.5 -1.0

ON-PT-BR

Degrees

80 60 40 20 0

ON-SC-HN

6 4 2 0 -2

ON-SC-NL

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

10

5

0

ON-SC-FD

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 64 created 15-NOV-2004 14:33:33

10 5 0

ON-SC-LA

5 0 -5

ON-SC-KP

Degrees

0 -2 -4

ON-SC-OV

15 10 5

ON-SC-BR

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

0 -20 -40 -60

ON-HN-NL

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 65 created 15-NOV-2004 14:33:34

0 -20 -40 -60

ON-HN-FD

20 0 -20 -40 -60

ON-HN-LA

Degrees

20 0 -20 -40

ON-HN-KP

-5 -10 -15

ON-HN-OV

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

20 0 -20 -40 -60

ON-HN-BR

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 66 created 15-NOV-2004 14:33:34

2 0 -2 -4

ON-NL-FD

4 2 0 -2 -4

ON-NL-LA

Degrees

8 6 4 2 0 -2

ON-NL-KP

4 2 0 -2

ON-NL-OV

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

-2 -4 -6 -8

ON-NL-BR

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 67 created 15-NOV-2004 14:33:34

1 0 -1 -2

ON-FD-LA

0.0 -0.5 -1.0 -1.5 -2.0 -2.5

ON-FD-KP

Degrees

-2 -3 -4 -5

ON-FD-OV

-4.5 -5.0 -5.5 -6.0 -6.5 -7.0

ON-FD-BR

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

-4 -5 -6 -7

ON-LA-KP

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 68 created 15-NOV-2004 14:33:34

-7 -8 -9 -10

ON-LA-OV

1 0 -1 -2 -3

ON-LA-BR

Degrees

-9.0 -9.5 -10.0 -10.5 -11.0 -11.5

ON-KP-OV

5 4 3 2

ON-KP-BR

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

4 3 2 1

ON-OV-BR

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 69 created 15-NOV-2004 14:33:34

1.5 1.0 0.5 0.0 -0.5

TR-WB-NT

3 2 1 0

TR-WB-PT

Degrees

-12 -14 -16 -18 -20 -22

TR-WB-SC

50 40 30 20 10

TR-WB-HN

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

4 2 0 -2

TR-WB-NL

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 70 created 15-NOV-2004 14:33:34

3.0 2.5 2.0 1.5 1.0

TR-WB-FD

2 1 0

TR-WB-LA

Degrees

4 3 2 1

TR-WB-KP

1.0 0.5 0.0 -0.5 -1.0 -1.5

TR-WB-OV

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

1 0 -1 -2

TR-WB-BR

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 71 created 15-NOV-2004 14:33:34 1.5 1.0 0.5 0.0 -0.5

TR-NT-PT

-40 -50 -60 -70

TR-NT-SC

Degrees

10 0 -10 -20

TR-NT-HN

1 0 -1 -2

TR-NT-NL

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

1 0 -1 -2

TR-NT-FD

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 72 created 15-NOV-2004 14:33:34

5 4 3 2 1

TR-NT-LA

12 10 8 6

TR-NT-KP

Degrees

5.5 5.0 4.5 4.0 3.5

TR-NT-OV

3.5 3.0 2.5 2.0 1.5

TR-NT-BR

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

15 10 5 0

TR-PT-SC

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 75 created 15-NOV-2004 14:33:34

30 20 10 0

TR-SC-LA

30 20 10 0 -10

TR-SC-KP

Degrees

15 10 5 0 -5

TR-SC-OV

30 20 10

TR-SC-BR

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

10 0 -10 -20

TR-HN-NL

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 76 created 15-NOV-2004 14:33:34

20 10 0 -10 -20

TR-HN-FD

30 20 10 0

TR-HN-LA

Degrees

40 30 20 10

TR-HN-KP

20 15 10 5

TR-HN-OV

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

30 20 10 0 -10

TR-HN-BR

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 77 created 15-NOV-2004 14:33:34

2 1 0

TR-NL-FD

1.5 1.0 0.5 0.0 -0.5 -1.0

TR-NL-LA

Degrees

7 6 5 4

TR-NL-KP

4 2 0 -2

TR-NL-OV

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

-2 -3 -4 -5 -6

TR-NL-BR

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 78 created 15-NOV-2004 14:33:34

-0.5 -1.0 -1.5 -2.0 -2.5

TR-FD-LA

2 1 0 -1 -2 -3

TR-FD-KP

Degrees

-3 -4 -5

TR-FD-OV

-4 -5 -6 -7

TR-FD-BR

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

-1 -2 -3 -4 -5

TR-LA-KP

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 79 created 15-NOV-2004 14:33:34 -6 -7 -8 -9

TR-LA-OV

2 1 0 -1

TR-LA-BR

Degrees

-10.0 -10.5 -11.0 -11.5 -12.0 -12.5

TR-KP-OV

6 4 2 0

TR-KP-BR

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

5 4 3 2

TR-OV-BR

IF 1- 8 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 3C345.UVSUB.1

PLot file version 80 created 15-NOV-2004 14:33:35

0.5 0.0 -0.5 -1.0 -1.5 -2.0

WB-NT-PT

-20 -30 -40 -50

WB-NT-SC

Degrees

-30 -35 -40 -45 -50 -55

WB-NT-HN

2 0 -2 -4

WB-NT-NL

TIME (HOURS)

1/04 27 45 28 00 15 30 45 29 00 15 30 45

0 -1 -2 -3 -4

WB-NT-FD