Center at RA 05 54 00.80627 DEC 68 57 54.4424

CONT: J0554+68 IPOL 4991.381 MHZ J0554+6857.IIM001.2

PLot file version 1 created 15-NOV-2004 13:10:36

Cont peak flux = 8.9678E-02 JY/BEAM Levs = 8.968E-02 * (-0.026, 0.026, 0.053, 0.105, 0.211, 0.421, 0.843)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100