Gain amp vs UTC time for J0926+4029.MULTI.1 SN 2 Lpol IF 1 - 8

Plot file version 1 created 15-NOV-2004 14:12:58

1L EF IF 1

1.00 0.95 0.90 0.85 1L EF IF 2 1.0 0.9 0.8 1L EF IF 3

1.00

0.95

0.90 1L EF IF 4

1.00 0.95 0.90

1L EF IF 5 1.0 0.9 0.8 1L EF IF 6

Gain

1.00

0.95

0.90

1L EF IF 7 1.0 0.9 0.8 1L EF IF 8 1.0 0.9 0.8 2L JB IF 1 1.1 1.0 0.9 0.8 2L JB IF 2

TIME (HOURS)

1/18 1/19 1/20 1/21 1/22 1/23

1.2 1.1 1.0 0.9

Gain amp vs UTC time for J0926+4029.MULTI.1 SN 2 Lpol IF 1 - 8

Plot file version 2 created 15-NOV-2004 14:12:58

2L JB IF 3 1.3 1.2 1.1 2L JB IF 4 1.1 1.0 0.9 2L JB IF 5 1.1 1.0 0.9 0.8 2L JB IF 6 1.4 1.2 1.0 0.8 2L JB IF 7 1.2 1.1 1.0 0.9 2L JB IF 8

Gain

1.1 1.0 0.9 3L MC IF 1 1.1 1.0 0.9 0.8 3L MC IF 2 1.2 1.0 0.8 0.6 3L MC IF 3 1.0 0.8 0.6 3L MC IF 4

TIME (HOURS)

1/18 1/19 1/20 1/21 1/22 1/23

1.0 0.8 0.6 0.4

Gain amp vs UTC time for J0926+4029.MULTI.1 SN 2 Lpol IF 1 - 8

Plot file version 3 created 15-NOV-2004 14:12:58

3L MC IF 5 1.4 1.2 1.0 0.8 0.6 3L MC IF 6 1.1 1.0 0.9 0.8 0.7 3L MC IF 7 1.2 1.0 0.8 0.6 3L MC IF 8 1.2 1.0 0.8 0.6 4L ON IF 1 1.2 1.1 1.0 0.9 4L ON IF 2

Gain

1.1 1.0 0.9 4L ON IF 3 1.2 1.1 1.0 0.9 4L ON IF 4 1.2 1.1 1.0 0.9 4L ON IF 5 1.2 1.1 1.0 4L ON IF 6

TIME (HOURS)

1/18 1/19 1/20 1/21 1/22 1/23

1.2 1.1 1.0

Gain amp vs UTC time for J0926+4029.MULTI.1 SN 2 Lpol IF 1 - 8

Plot file version 4 created 15-NOV-2004 14:12:58

4L ON IF 7 1.2 1.1 1.0 0.9 4L ON IF 8 1.2 1.1 1.0 0.9 5L TR IF 1

0.80 0.75 0.70 0.65

5L TR IF 2 0.9 0.8 0.7 5L TR IF 3

0.75 0.70 0.65

5L TR IF 4

Gain

0.85 0.80 0.75 0.70

5L TR IF 5 0.9 0.8 0.7 5L TR IF 6

0.80 0.75 0.70 0.65

5L TR IF 7 1.0 0.9 0.8 0.7 5L TR IF 8

TIME (HOURS)

1/18 1/19 1/20 1/21 1/22 1/23

0.9 0.8 0.7

Gain amp vs UTC time for J0926+4029.MULTI.1 SN 2 Lpol IF 1 - 8

Plot file version 5 created 15-NOV-2004 14:12:58

6L WB IF 1 2.0 1.5 1.0 0.5 6L WB IF 2 2.5 2.0 1.5 1.0 0.5 6L WB IF 3 1.0 0.8 0.6 0.4 6L WB IF 4 2.0 1.5 1.0 6L WB IF 5 2.5 2.0 1.5 1.0 6L WB IF 6

Gain

1.2 1.0 0.8 0.6 0.4 0.2 6L WB IF 7 1.5 1.0 0.5 6L WB IF 8 1.2 1.0 0.8 0.6 0.4 7L NT IF 1 1.8 1.6 1.4 1.2 1.0 0.8 7L NT IF 2

TIME (HOURS)

1/18 1/19 1/20 1/21 1/22 1/23

2.5 2.0 1.5 1.0

Gain amp vs UTC time for J0926+4029.MULTI.1 SN 2 Lpol IF 1 - 8

Plot file version 6 created 15-NOV-2004 14:12:58

7L NT IF 3 2.0 1.5 1.0 7L NT IF 4 2.5 2.0 1.5 1.0 7L NT IF 5 2.0 1.5 1.0 7L NT IF 6 2.0 1.5 1.0 7L NT IF 7 1.5 1.0 0.5 0.0 7L NT IF 8

Gain

2.5 2.0 1.5 1.0 8L PT IF 1 2.0 1.5 1.0 8L PT IF 2 1.5 1.0 0.5 8L PT IF 3 2.0 1.5 1.0 8L PT IF 4

TIME (HOURS)

1/18 1/19 1/20 1/21 1/22 1/23

2.0 1.5 1.0 0.5

Gain amp vs UTC time for J0926+4029.MULTI.1 SN 2 Lpol IF 1 - 8

Plot file version 7 created 15-NOV-2004 14:12:58

8L PT IF 5 2.0 1.5 1.0 8L PT IF 6 2.0 1.5 1.0 0.5 8L PT IF 7 1.6 1.4 1.2 1.0 8L PT IF 8 2.0 1.5 1.0 9L SC IF 1 2.0 1.5 1.0 9L SC IF 2

Gain

2.5 2.0 1.5 1.0 9L SC IF 3 2.0 1.5 1.0 9L SC IF 4 1.6 1.4 1.2 1.0 0.8 0.6 9L SC IF 5 1.6 1.4 1.2 1.0 9L SC IF 6

TIME (HOURS)

1/18 1/19 1/20 1/21 1/22 1/23

1.6 1.4 1.2 1.0

Gain amp vs UTC time for J0926+4029.MULTI.1 SN 2 Lpol IF 1 - 8

Plot file version 8 created 15-NOV-2004 14:12:58

9L SC IF 7 1.8 1.6 1.4 1.2 1.0 9L SC IF 8 1.6 1.4 1.2 1.0 10L HN IF 1 2.0 1.5 1.0 10L HN IF 2 1.4 1.2 1.0 10L HN IF 3 1.4 1.2 1.0 10L HN IF 4

Gain

1.6 1.4 1.2 1.0 10L HN IF 5 2.0 1.5 1.0 10L HN IF 6 1.4 1.2 1.0 10L HN IF 7 1.8 1.6 1.4 1.2 1.0 10L HN IF 8

TIME (HOURS)

1/18 1/19 1/20 1/21 1/22 1/23

1.8 1.6 1.4 1.2 1.0 0.8

Gain amp vs UTC time for J0926+4029.MULTI.1 SN 2 Lpol IF 1 - 8

Plot file version 9 created 15-NOV-2004 14:12:58

11L NL IF 1 1.5 1.0 0.5 11L NL IF 2 1.6 1.4 1.2 1.0 11L NL IF 3 1.6 1.4 1.2 1.0 11L NL IF 4 1.8 1.6 1.4 1.2 1.0 11L NL IF 5 1.6 1.4 1.2 1.0 11L NL IF 6

Gain

1.8 1.6 1.4 1.2 1.0 11L NL IF 7 1.5 1.0 0.5 11L NL IF 8 1.5 1.0 0.5 12L FD IF 1 2.0 1.5 1.0 12L FD IF 2

TIME (HOURS)

1/18 1/19 1/20 1/21 1/22 1/23

2.0 1.5 1.0

Gain amp vs UTC time for J0926+4029.MULTI.1 SN 2 Lpol IF 1 - 8

Plot file version 10 created 15-NOV-2004 14:12:58

12L FD IF 3 2.0 1.5 1.0 12L FD IF 4 2.0 1.5 1.0 12L FD IF 5 2.0 1.5 1.0 12L FD IF 6 2.0 1.5 1.0 12L FD IF 7 3 2 1 12L FD IF 8

Gain

2.5 2.0 1.5 1.0 13L LA IF 1 1.8 1.6 1.4 1.2 1.0 13L LA IF 2 2.5 2.0 1.5 1.0 13L LA IF 3 1.8 1.6 1.4 1.2 1.0 13L LA IF 4

TIME (HOURS)

1/18 1/19 1/20 1/21 1/22 1/23

2.0 1.5 1.0

Gain amp vs UTC time for J0926+4029.MULTI.1 SN 2 Lpol IF 1 - 8

Plot file version 11 created 15-NOV-2004 14:12:58

13L LA IF 5 2.0 1.5 1.0 13L LA IF 6 2.0 1.5 1.0 13L LA IF 7 2.0 1.5 1.0 13L LA IF 8 2.5 2.0 1.5 1.0 0.5 14L KP IF 1 1.8 1.6 1.4 1.2 1.0 14L KP IF 2

Gain

1.8 1.6 1.4 1.2 1.0 14L KP IF 3 1.8 1.6 1.4 1.2 1.0 14L KP IF 4 2.0 1.5 1.0 14L KP IF 5 2.0 1.5 1.0 14L KP IF 6

TIME (HOURS)

1/18 1/19 1/20 1/21 1/22 1/23

1.8 1.6 1.4 1.2 1.0

Gain amp vs UTC time for J0926+4029.MULTI.1 SN 2 Lpol IF 1 - 8

Plot file version 12 created 15-NOV-2004 14:12:59

14L KP IF 7 1.6 1.4 1.2 1.0 14L KP IF 8 1.8 1.6 1.4 1.2 1.0 15L OV IF 1 1.8 1.6 1.4 1.2 1.0 15L OV IF 2 2.0 1.5 1.0 15L OV IF 3 2.0 1.5 1.0 0.5 15L OV IF 4

Gain

2.0 1.5 1.0 15L OV IF 5 1.5 1.0 0.5 15L OV IF 6 2.0 1.5 1.0 15L OV IF 7 1.8 1.6 1.4 1.2 1.0 15L OV IF 8

TIME (HOURS)

1/18 1/19 1/20 1/21 1/22 1/23

1.8 1.6 1.4 1.2 1.0