Center at RA 11 48 56.56902 DEC 52 54 25.3233

CONT: J1148+52 IPOL 4991.381 MHZ J1148+5254.ICL001.5

PLot file version 1 created 15-NOV-2004 14:21:22

Cont peak flux = 4.3299E-01 JY/BEAM Levs = 4.330E-01 * (-0.004, 0.004, 0.009, 0.017, 0.034, 0.068, 0.137, 0.274, 0.548)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100