Center at RA 15 39 25.09906 DEC 16 04 00.3404

CONT: J1539+16 IPOL 4991.381 MHZ J1539+1604.IIM001.2

PLot file version 1 created 15-NOV-2004 13:10:52

Cont peak flux = 8.7696E-02 JY/BEAM Levs = 8.770E-02 * (-0.071, 0.071, 0.143, 0.285, 0.571)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100