Tsys vs UTC time for gk029.MSORT.1 TY 1 Lpol IF 1 - 8

Plot file version 1 created 11-NOV-2004 17:10:47

1L EF IF 1 80 60 40 20 1L EF IF 2 80 60 40 20 1L EF IF 3 80 60 40 20 1L EF IF 4 80 60 40 20 1L EF IF 5 80 60 40 20 1L EF IF 6

Kelvin

80 60 40 20 1L EF IF 7 80 60 40 20 1L EF IF 8 80 60 40 20 2L JB IF 1 65 60 55 50 45 2L JB IF 2

TIME (HOURS)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14 1/16 1/18 1/20 1/22 2/00

65 60 55 50 45

Tsys vs UTC time for gk029.MSORT.1 TY 1 Lpol IF 1 - 8

Plot file version 2 created 11-NOV-2004 17:10:47

2L JB IF 3 60 55 50 45 2L JB IF 4 60 55 50 45 2L JB IF 5 60 55 50 45 2L JB IF 6 70 60 50 2L JB IF 7 65 60 55 50 45 2L JB IF 8

Kelvin

65 60 55 50 45 3L MC IF 1 80 60 40 3L MC IF 2 80 60 40 3L MC IF 3 80 60 40 3L MC IF 4

TIME (HOURS)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14 1/16 1/18 1/20 1/22 2/00

80 60 40

Tsys vs UTC time for gk029.MSORT.1 TY 1 Lpol IF 1 - 8

Plot file version 3 created 11-NOV-2004 17:10:47

3L MC IF 5 80 60 40 3L MC IF 6 80 60 40 3L MC IF 7 80 60 40 3L MC IF 8 80 60 40 4L ON IF 1 65 60 55 50 4L ON IF 2

Kelvin

65 60 55 50 4L ON IF 3 65 60 55 50 4L ON IF 4 70 60 50 4L ON IF 5 65 60 55 50 4L ON IF 6

TIME (HOURS)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14 1/16 1/18 1/20 1/22 2/00

70 60 50

Tsys vs UTC time for gk029.MSORT.1 TY 1 Lpol IF 1 - 8

Plot file version 4 created 11-NOV-2004 17:10:47

4L ON IF 7 65 60 55 50 4L ON IF 8 65 60 55 50 5L TR IF 1 18 16 14 12 10 8 5L TR IF 2 14 12 10 8 5L TR IF 3 16 14 12 10 8 6 5L TR IF 4

Kelvin

16 14 12 10 8 6 5L TR IF 5 16 14 12 10 8 6 5L TR IF 6 15 10 5 5L TR IF 7 12 10 8 6 5L TR IF 8

TIME (HOURS)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14 1/16 1/18 1/20 1/22 2/00

14 12 10 8 6

Tsys vs UTC time for gk029.MSORT.1 TY 1 Lpol IF 1 - 8

Plot file version 5 created 11-NOV-2004 17:10:48

6L WB IF 1 100 90 80 6L WB IF 2 100 90 80 6L WB IF 3 100 90 80 6L WB IF 4 100 90 80 6L WB IF 5 95 90 85 80 6L WB IF 6

Kelvin

95 90 85 80 6L WB IF 7 110 100 90 6L WB IF 8 110 100 90 7L NT IF 1 70 60 50 40 30 7L NT IF 2

TIME (HOURS)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14 1/16 1/18 1/20 1/22 2/00

80 60 40

Tsys vs UTC time for gk029.MSORT.1 TY 1 Lpol IF 1 - 8

Plot file version 6 created 11-NOV-2004 17:10:48

7L NT IF 3 80 60 40 7L NT IF 4 70 60 50 40 7L NT IF 5 80 60 40 7L NT IF 6 80 60 40 7L NT IF 7 70 60 50 40 7L NT IF 8

Kelvin

70 60 50 40 8L PT IF 1 55 50 45 8L PT IF 2 60 55 50 45 8L PT IF 3 60 55 50 45 8L PT IF 4

TIME (HOURS)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14 1/16 1/18 1/20 1/22 2/00

60 55 50 45

Tsys vs UTC time for gk029.MSORT.1 TY 1 Lpol IF 1 - 8

Plot file version 7 created 11-NOV-2004 17:10:48

8L PT IF 5 60 55 50 45 8L PT IF 6 60 55 50 45 8L PT IF 7 60 55 50 45 8L PT IF 8 55 50 45 40 9L SC IF 1 60 50 40 9L SC IF 2

Kelvin

60 50 40 9L SC IF 3 60 50 40 9L SC IF 4 60 50 40 9L SC IF 5 70 60 50 40 9L SC IF 6

TIME (HOURS)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14 1/16 1/18 1/20 1/22 2/00

80 60 40

Tsys vs UTC time for gk029.MSORT.1 TY 1 Lpol IF 1 - 8

Plot file version 8 created 11-NOV-2004 17:10:48

9L SC IF 7 80 60 40 9L SC IF 8 80 60 40 10L HN IF 1 80 60 40 10L HN IF 2 80 60 40 10L HN IF 3 80 60 40 10L HN IF 4

Kelvin

80 60 40 10L HN IF 5 100 80 60 40 10L HN IF 6 100 80 60 40 10L HN IF 7 120 100 80 60 40 10L HN IF 8

TIME (HOURS)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14 1/16 1/18 1/20 1/22 2/00

120 100 80 60 40

Tsys vs UTC time for gk029.MSORT.1 TY 1 Lpol IF 1 - 8

Plot file version 9 created 11-NOV-2004 17:10:48

11L NL IF 1 80 60 40 11L NL IF 2 80 60 40 11L NL IF 3 70 60 50 40 30 11L NL IF 4 70 60 50 40 30 11L NL IF 5 80 60 40 11L NL IF 6

Kelvin

100 80 60 40 20 11L NL IF 7 100 80 60 40 20 11L NL IF 8 120 100 80 60 40 20 12L FD IF 1 55 50 45 40 12L FD IF 2

TIME (HOURS)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14 1/16 1/18 1/20 1/22 2/00

55 50 45 40

Tsys vs UTC time for gk029.MSORT.1 TY 1 Lpol IF 1 - 8

Plot file version 10 created 11-NOV-2004 17:10:48

12L FD IF 3 55 50 45 40 12L FD IF 4 60 50 40 12L FD IF 5 60 55 50 45 12L FD IF 6 60 50 40 12L FD IF 7 55 50 45 40 12L FD IF 8

Kelvin

55 50 45 40 13L LA IF 1 50 45 40 13L LA IF 2 50 45 40 13L LA IF 3 50 45 40 13L LA IF 4

TIME (HOURS)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14 1/16 1/18 1/20 1/22 2/00

50 45 40

Tsys vs UTC time for gk029.MSORT.1 TY 1 Lpol IF 1 - 8

Plot file version 11 created 11-NOV-2004 17:10:48

13L LA IF 5 50 45 40 13L LA IF 6 55 50 45 40 13L LA IF 7 55 50 45 40 13L LA IF 8 55 50 45 40 14L KP IF 1 70 60 50 14L KP IF 2

Kelvin

70 60 50 14L KP IF 3 70 60 50 14L KP IF 4 70 60 50 14L KP IF 5 70 60 50 14L KP IF 6

TIME (HOURS)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14 1/16 1/18 1/20 1/22 2/00

70 60 50

Tsys vs UTC time for gk029.MSORT.1 TY 1 Lpol IF 1 - 8

Plot file version 12 created 11-NOV-2004 17:10:48

14L KP IF 7 70 60 50 14L KP IF 8 70 60 50 15L OV IF 1 300 200 100 15L OV IF 2 300 200 100 15L OV IF 3 300 200 100 15L OV IF 4

Kelvin

300 200 100 15L OV IF 5 300 200 100 15L OV IF 6 300 200 100 15L OV IF 7 300 200 100 15L OV IF 8

TIME (HOURS)

18 20 22 1/00 1/02 1/04 1/06 1/08 1/10 1/12 1/14 1/16 1/18 1/20 1/22 2/00

300 200 100