Center at RA 22 02 43.29138 DEC 42 16 39.9799

CONT: 2200+420 IPOL 4989.302 MHZ 2200+420.ICL001.5

PLot file version 1 created 02-DEC-2005 18:50:27

Cont peak flux = 1.0757E+00 JY/BEAM Levs = 1.076E+00 * (-0.020, 0.020, 0.041, 0.081, 0.162, 0.325, 0.649)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100