Center at RA 18 19 26.55000 DEC 38 45 01.8000

CONT: J1819+38 IPOL 4989.302 MHZ J1819+3845.ICL001.5

PLot file version 1 created 02-DEC-2005 18:36:47

Cont peak flux = 3.5702E-01 JY/BEAM Levs = 3.570E-01 * (-0.003, 0.003, 0.006, 0.013, 0.026, 0.052, 0.103, 0.206, 0.413, 0.825)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100