Gain amp vs UTC time for 1642+690.MULTI.1 SN 2 Rpol IF 1 - 8

Plot file version 1 created 17-NOV-2004 13:54:46

11R FD IF 1

1020 1010 1000 990 11R FD IF 2

1000 990 980 11R FD IF 3

1020 1015 1010 1005 11R FD IF 4

1030 1020 1010 1000 11R FD IF 5

1000 980 960 11R FD IF 6

MilliGain

980 960 940 11R FD IF 7 950 940 930 920 11R FD IF 8 980 970 960 12R LA IF 1 960 950 940 12R LA IF 2

TIME (HOURS)

17 11 00 15 30 45 12 00 15 30 45 13 00

1060 1040 1020 1000

Gain amp vs UTC time for 1642+690.MULTI.1 SN 2 Rpol IF 1 - 8

Plot file version 2 created 17-NOV-2004 13:54:46

12R LA IF 3

1160 1150 1140 1130

12R LA IF 4 980 970 960 12R LA IF 5 980 975 970 965 12R LA IF 6

1000 980 960 940 12R LA IF 7

1020 1000 980 960 12R LA IF 8

MilliGain

970 960 950 940 13R PT IF 1

1010 1005 1000 995 13R PT IF 2

1300 1200 1100 1000 13R PT IF 3

1150 1100 1050 1000 13R PT IF 4

TIME (HOURS)

17 11 00 15 30 45 12 00 15 30 45 13 00

1060 1040 1020

Gain amp vs UTC time for 1642+690.MULTI.1 SN 2 Rpol IF 1 - 8

Plot file version 3 created 17-NOV-2004 13:54:46

13R PT IF 5

1025 1020 1015 1010

13R PT IF 6

1150 1100 1050 1000

13R PT IF 7 990 980 970 13R PT IF 8

1070 1060 1050 1040 1030

14R KP IF 1 950 940 930 14R KP IF 2

MilliGain

1100 1050 1000 950 14R KP IF 3

1150 1100 1050 1000

14R KP IF 4 985 980 975 970 965 14R KP IF 5 980 970 960 950 14R KP IF 6

TIME (HOURS)

17 11 00 15 30 45 12 00 15 30 45 13 00

1050

1000 950

Gain amp vs UTC time for 1642+690.MULTI.1 SN 2 Rpol IF 1 - 8

Plot file version 4 created 17-NOV-2004 13:54:46

14R KP IF 7

1100 1050 1000 950 14R KP IF 8

1060 1040 1020 1000 980 960 15R OV IF 1 990 985 980 975 15R OV IF 2

1080 1060 1040 1020 1000

15R OV IF 3

1060

1040

1020

15R OV IF 4

MilliGain

1010 1005 1000

15R OV IF 5 995 990 985 980 975 15R OV IF 6

1040 1020

1000 980 15R OV IF 7

1020 1000 980 960 15R OV IF 8

TIME (HOURS)

17 11 00 15 30 45 12 00 15 30 45 13 00

1020

1000 980

Gain amp vs UTC time for 1642+690.MULTI.1 SN 2 Rpol IF 1 - 8

Plot file version 5 created 17-NOV-2004 13:54:46

16R BR IF 1

1050

1040

1030

16R BR IF 2 980 960 940 16R BR IF 3

1020

1000 980 16R BR IF 4

1025 1020 1015 1010

16R BR IF 5

1030

1020

1010

16R BR IF 6

MilliGain

1000 980 960 16R BR IF 7

1040 1020 1000 980 960 16R BR IF 8

1010 1000 990 980 19R MK IF 1

1000 980 960 940 920 19R MK IF 2

TIME (HOURS)

17 11 00 15 30 45 12 00 15 30 45 13 00

1040 1020 1000

Gain amp vs UTC time for 1642+690.MULTI.1 SN 2 Rpol IF 1 - 8

Plot file version 6 created 17-NOV-2004 13:54:46

19R MK IF 3

1020

1000 980 19R MK IF 4

1050

1000 950 19R MK IF 5

1020 1000 980 960 940 920 19R MK IF 6

1020

1000 980 19R MK IF 7

1040 1030 1020 1010

19R MK IF 8

MilliGain

TIME (HOURS)

17 11 00 15 30 45 12 00 15 30 45 13 00

1040

1020

1000